F^~_2^D β=0.065

F^~_2^D

Q^2=8.5 GeV^2

β=0.175 Q^2=12 GeV^2

β=0.375 Q^2=25 GeV^2

Q^2 / GeV^2 β=0.65

β

Q^2=50 GeV^2

0 0.1 0.2 0.3 0.4

10 10^2

0 0.1 0.2 0.3 0.4

0 0.2 0.4 0.6 0.8 1

0 0.1 0.2 0.3 0.4

10 10^2

0 0.1 0.2 0.3 0.4

0 0.2 0.4 0.6 0.8 1

0 0.1 0.2 0.3 0.4

10 10^2

0 0.1 0.2 0.3 0.4

0 0.2 0.4 0.6 0.8 1

0 0.1 0.2 0.3 0.4

10 10^2 0 0.1 0.2 0.3 0.4

0 0.2 0.4 0.6 0.8 1