ATLAS SCT: Common mode noise from double-iteration method Run 1365 Scan 215 =0.80fC thr 1000000 events ar Q

Module

Common mode noise (ENC)

0

100

200

300

400

500

k5_302 k5_402 k5_400 k5_303