ATLAS SCT - Noise from occupancy - Sun Mar 24 17:36:29 2002 - B186 Forward System Test Run 1364 Scan 4 - noise estimated from a linear fit to (log n.o. vs Qthr2)

Module

Noise (ENC)

1100

1200

1300

1400

1500

1600

1700

1800

k5_302 k5_402 k5_400 k5_303

noise occupancy 3pt gain, ind. sector