1.E-08

1.E-07

1.E-06

1.E-05

1.E-04

1.E-03

1.E-02

k5_302 k5_402 k5_400 k5_303 Module

A ve ra g e N o is e O c u p an cy Multi-Module Individually on the sector Test Box