ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_302 Run 1365 Scans 104-203 Module 0 Stream 0 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.22

0.24

0.26

0.28 0.3 0.32

0.34

0.36

0.38 -4 x10 Chip 0 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.14

0.16

0.18 0.2 0.22

0.24

0.26

0.28 -4 x10 Chip 1 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.14

0.16

0.18 0.2 0.22

0.24

0.26

0.28 0.3 0.32

0.34 -4 x10 Chip 2 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.16

0.18 0.2 0.22

0.24

0.26

0.28 0.3 0.32

0.34 -4 x10 Chip 3 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.0007

0.0008

0.0009

0.001

0.0011

-1 x10 Chip 4 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.12

0.14

0.16

0.18

0.2

-4 x10 Chip 5 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_302 Run 1365 Scans 104-203 Module 0 Stream 1 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7 0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 -4 x10 Chip 6 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.12

0.14

0.16

0.18 0.2 0.22

0.24

0.26

0.28 0.3 -4 x10 Chip 7 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.15

0.2

0.25

0.3

0.35

-4 x10 Chip 8 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.08

0.1

0.12

0.14

0.16

0.18 -4 x10 Chip 9 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.18 0.2 0.22

0.24

0.26

0.28 0.3 0.32

0.34

0.36

0.38 -4 x10 Chip 10 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.16

0.18 0.2 0.22

0.24

0.26

0.28 0.3 -4 x10 Chip 11 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_402 Run 1365 Scans 104-203 Module 1 Stream 0 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.08

0.1

0.12

0.14

0.16

0.18 -4 x10 Chip 0 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.04

0.05

0.06

0.07

0.08

0.09 0.1

-4 x10 Chip 1 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.06

0.07

0.08

0.09

0.1

0.11 -4 x10 Chip 2 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 -4 x10 Chip 3 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22 -4 x10 Chip 4 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.06

0.08

0.1

0.12

0.14

0.16 -4 x10 Chip 5 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_402 Run 1365 Scans 104-203 Module 1 Stream 1 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.05

0.06

0.07

0.08

0.09 0.1 0.11

0.12

0.13 -4 x10 Chip 6 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.04

0.06

0.08

0.1

0.12

0.14

-4 x10 Chip 7 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22 -4 x10 Chip 8 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7 0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 -5 x10 Chip 9 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.12

0.14

0.16

0.18

0.2

0.22 -4 x10 Chip 10 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.18 0.2 0.22

0.24

0.26

0.28 0.3 -4 x10 Chip 11 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_400 Run 1365 Scans 104-203 Module 2 Stream 0 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.02

0.04

0.06

0.08

0.1

0.12 -5 x10 Chip 0 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.04

0.06

0.08

0.1

0.12

0.14

-5 x10 Chip 1 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7 0

0.02

0.04

0.06

0.08

0.1 -5 x10 Chip 2 - 0 strips cut

Time[h]

Occupancy

0 0

0 1 2 3 4 5 6 7 0

0.02

0.04

0.06

0.08

0.1 -5 x10 Chip 3 - 0 strips cut

Time[h]

Occupancy

0 0 0 1 2 3 4 5 6 7

0.05

0.1

0.15

0.2

0.25

-5 x10 Chip 4 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.05

0.1

0.15

0.2

0.25 -5 x10 Chip 5 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_400 Run 1365 Scans 104-203 Module 2 Stream 1 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.02

0.04

0.06

0.08

0.1

0.12

0.14 -5 x10 Chip 6 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.02

0.04

0.06

0.08 0.1 0.12

0.14 -5 x10 Chip 7 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 -6 x10 Chip 8 - 0 strips cut

Time[h]

Occupancy

0 0

0 1 2 3 4 5 6 7

0.08 0.1

0.12

0.14

0.16

0.18

0.2 -5 x10 Chip 9 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.02

0.04

0.06

0.08

0.1

0.12 -5 x10 Chip 10 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.04

0.06

0.08

0.1

0.12

0.14 -5 x10 Chip 11 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_303 Run 1365 Scans 104-203 Module 3 Stream 0 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.15

0.16

0.17

0.18

0.19 0.2 0.21

0.22

-4 x10 Chip 0 - 1 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.35 0.4 0.45 0.5 0.55 0.6 0.65 -5 x10 Chip 1 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.15

0.2

0.25

0.3

0.35

0.4

-5 x10 Chip 2 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.4

0.45

0.5

0.55

0.6

-5 x10 Chip 3 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.07

0.075

0.08

0.085

0.09

0.095 0.1 0.105

0.11 -4 x10 Chip 4 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7 0.3

0.35

0.4

0.45

0.5 -5 x10 Chip 5 - 0 strips cut

Time[h]

Occupancy

ATLAS SCT: Noise Occ. vs Time - Mon Mar 25 18:03:15 2002 - B186 Forward System Test - Module k5_303 Run 1365 Scans 104-203 Module 3 Stream 1 Noise Occupancy at Qthr=1.0fC vs Time - Projection per Chip, upper cut at 50 strip-median

0 1 2 3 4 5 6 7

0.4

0.45

0.5

0.55

0.6 -5 x10 Chip 6 - 0 strips cut

Time[h]

0 1 2 3 4 5 6 7

0.35

0.4

0.45

0.5

0.55

0.6

0.65 -5 x10 Chip 7 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.25

0.3

0.35

0.4

0.45

0.5 -5 x10 Chip 8 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.25 0.3 0.35 0.4 0.45 0.5 0.55 -5 x10 Chip 9 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 -5 x10 Chip 10 - 0 strips cut

Time[h]

Occupancy

0 1 2 3 4 5 6 7

0.13

0.14

0.15

0.16

0.17

0.18 -4 x10 Chip 11 - 0 strips cut

Time[h]

Occupancy