0 2 4 6 8 10 12

1100

1200

1300

1400

1500

1600

1700

1800

1900

Noise from calibration scan

Module-index

0 2 4 6 8 10

Strip-noise in chip-average (ENC)

Noise from calibration scan multi-module, sector individual, elec. bench