Channel Number

0 200 400 600 800 1000 1200 1400

Noise

0 200 400 600 800 1000

1200

1400

1600

1800

2000 hr1 Nent = 0 Mean x = 0 Mean y = 0 RMS x = 0 RMS y = 0

Channel Number

0 200 400 600 800 1000 1200 1400

Noise

0 200 400 600 800 1000

1200

1400

1600

1800

2000 hr2 Nent = 0 Mean x = 0 Mean y = 0 RMS x = 0 RMS y = 0

Channel Number

0 200 400 600 800 1000 1200 1400

Noise

0 200 400 600 800 1000

1200

1400

1600

1800

2000 hr3 Nent = 0 Mean x = 0 Mean y = 0 RMS x = 0 RMS y = 0

Channel Number

0 200 400 600 800 1000 1200 1400

Noise

0 200 400 600 800 1000

1200

1400

1600

1800

2000 hr4 Nent = 0 Mean x = 0 Mean y = 0 RMS x = 0 RMS y = 0