test1
test3

VT2VT1VCCA-GND
ring-a

STRIP BIAS

N.B. GND CONNECTS TO

OF SUBSTRATE

CORNER OF TOP SIDE

AND GROUND AT TOP RH

BONDING OF DETECTOR HT

FANOUT

GNDGNDHT