0

5000

10000

15000

20000

25000

0 100 200 V bias (– V)

Charge (e)

5.760 / 7 P1 1428. 18.41 P2 229.9 14.10

21660 Α 720 5

(a) (V fcc)

dec 6 cm 0

5000

10000

15000

20000

25000

0 100 200 V bias (– V)

Charge (e)

3.467 / 7 P1 1492. 16.25 P2 216.4 9.245

21950 Α 530 5

(a) (V fcc)

dec 12 cm