0

5000

10000

15000

20000

25000

0 100 200 V bias (– V)

Charge (e)

7.453 / 6 P1 1494. 13.19 P2 218.7 6.886

22100 Α 400 5

(a) (V fcc)

peak 6 cm 0

5000

10000

15000

20000

25000

0 100 200 V bias (– V)

Charge (e)

6.635 / 6 P1 1542. 11.72 P2 201.1 4.556

21870 Α 300 5

(a) (V fcc)

peak 12 cm