ATLAS SCT Module Test - Tue Jul 04 12:07:12 2000 - UNKNOWN - Module fwd0 Run 139 Scan 2 Module 0 Link 0 - THRESHOLD (mV) from 0.00mV to 500.00mV in 10.00mV steps, total 51 points

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 127

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 128

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 129

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 130

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 131

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 132

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 133

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 134

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 135

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 136

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 137

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 138

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 139

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 140

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 141

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 142

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 143

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 144

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 145

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 146

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 147

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 148

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 149

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 150

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 151

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 152

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 153

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 154

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 155

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 156

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 157

THRESHOLD (mV)

0 50100150200250300350400450500 0 200 400 600 800 1000

Channel 158