0

200

400

600

800

1000

Channel Number

100 200 300 400 500 600 700

STROBE DELAY

0

10

20

30

40

50

60 Module 0 Stream 0 STROBE DELAY Scan Nent = 98304

STROBE DELAY

0 10 20 30 40 50 60 0 200 400 600 800 1000

1200 x10^2

Scan Projection for chip 0_{Nent = 1433919}

STROBE DELAY

0 10 20 30 40 50 60 0

200 400

600

800

1000

1200 x10^2

Scan Projection for chip 1_{Nent = 1439794}

STROBE DELAY

0 10 20 30 40 50 60 0 200

400 600

800 1000

1200 x10^2

Scan Projection for chip 2_{Nent = 1408511}

STROBE DELAY

0 10 20 30 40 50 60 0 200 400 600 800 1000

1200 x10^2

Scan Projection for chip 3_{Nent = 1434547}

STROBE DELAY

0 10 20 30 40 50 60 0 200 400 600 800 1000

1200 x10^2

Scan Projection for chip 4_{Nent = 1410213}

STROBE DELAY

0 10 20 30 40 50 60 0 200 400 600 800 1000

1200 x10^2

Scan Projection for chip 5