ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 4 Charge 3.00fC) - (Run 1 Scan 3 Charge 2.00fC)

Channel Number

100 200 300 400 500 600 700

Gain at 2.50fC (mV/fC)

48

50

52

54

56

58 Gain (mV/fC)

Channel Number

100 200 300 400 500 600 700

Offset at 2.50fC (mV)

90

100

110

120

130

140 Offset (mV)

Channel Number

100 200 300 400 500 600 700

Input Noise at 2.50fC (ENC)

500

550

600

650

700 Noise (ENC)

Gain at 2.50fC (mV/fC)

40 45 50 55 60 65 70 75 80 n(Gain)

0

20

40

60

80

100

120

140

160

180

200 Gain, all channels

Offset at 2.50fC (mV)

0 20 40 60 80 100 120 140 n(Offset)

0

20

40

60

80

100

Offset, all channels

Input Noise at 2.50fC (ENC)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 n(Noise)

0

50

100

150

200

250

300

350

400 Noise, all channels

ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 4 Charge 3.00fC) - (Run 1 Scan 3 Charge 2.00fC)

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

5

10

15

20

25 Gain, chip 0

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

2

4

6

8

10

12

Gain, chip 1

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

2

4

6

8

10

12

14

16

18

20 Gain, chip 2

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 3

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0 2

4

6

8

10

12

14

16

18 20

22 Gain, chip 4

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0 2

4

6

8

10

12

14

16

18 20

22 Gain, chip 5

Offset(mV)

90 100 110 120 130 140

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 Offset, chip 0

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

12 Offset, chip 1

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

12

14

16

18

20 Offset, chip 2

Offset(mV)

90 100 110 120 130 140

N(Mean)

0 2

4

6

8

10

12

14

16

18 20

22 Offset, chip 3

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 4

Offset(mV)

90 100 110 120 130 140

N(Mean)

0 2

4

6

8

10

12

14

16

18 20

22 Offset, chip 5

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

Input Noise, chip 0

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

18

Input Noise, chip 1

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

18

Input Noise, chip 2

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

Input Noise, chip 3

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

Input Noise, chip 4

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

Input Noise, chip 5

ATLAS SCT Module Test Run 1 Burst 164 Date 20000508 Time 190130 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 131200 Events_seen 131200 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0 100 200 300 400 500 600 700 800 Mustard Counters h_merr Nent = 20

Channel Number

0 100 200 300 400 500 600 700

Hits

0 20 40 60 80 100 120 140 160 Module 0 Stream 0 Burst Data h_burst0 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 0 Stream 1 Burst Data h_burst1 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 1 Burst Data

Run Trigs_sent 131200 Events_seen 131200 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 165 Date 20000508 Time 190132 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 132000 Events_seen 132000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 20 40 60 80 100 120 140 160 180 200

0 20 40 60 80 100 120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100

ATLAS SCT Module Test Run 1 Burst 166 Date 20000508 Time 190133

Run Trigs_sent 132800 Events_seen 132800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105

ATLAS SCT Module Test Run 1 Burst 167 Date 20000508 Time 190134

Run Trigs_sent 133600 Events_seen 133600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110

ATLAS SCT Module Test Run 1 Burst 168 Date 20000508 Time 190136

Run Trigs_sent 134400 Events_seen 134400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115

ATLAS SCT Module Test Run 1 Burst 169 Date 20000508 Time 190137

Run Trigs_sent 135200 Events_seen 135200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120

ATLAS SCT Module Test Run 1 Burst 170 Date 20000508 Time 190138

Run Trigs_sent 136000 Events_seen 136000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125

ATLAS SCT Module Test Run 1 Burst 171 Date 20000508 Time 190139

Run Trigs_sent 136800 Events_seen 136800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130

ATLAS SCT Module Test Run 1 Burst 172 Date 20000508 Time 190140

Run Trigs_sent 137600 Events_seen 137600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135

ATLAS SCT Module Test Run 1 Burst 173 Date 20000508 Time 190141

Run Trigs_sent 138400 Events_seen 138400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140

ATLAS SCT Module Test Run 1 Burst 174 Date 20000508 Time 190142

Run Trigs_sent 139200 Events_seen 139200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145

ATLAS SCT Module Test Run 1 Burst 175 Date 20000508 Time 190143

Run Trigs_sent 140000 Events_seen 140000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 176 Date 20000508 Time 190144

Run Trigs_sent 140800 Events_seen 140800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 177 Date 20000508 Time 190145

Run Trigs_sent 141600 Events_seen 141600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 178 Date 20000508 Time 190146

Run Trigs_sent 142400 Events_seen 142400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 179 Date 20000508 Time 190147

Run Trigs_sent 143200 Events_seen 143200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 180 Date 20000508 Time 190148

Run Trigs_sent 144000 Events_seen 144000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 181 Date 20000508 Time 190149

Run Trigs_sent 144800 Events_seen 144800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180

ATLAS SCT Module Test Run 1 Burst 182 Date 20000508 Time 190150

Run Trigs_sent 145600 Events_seen 145600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185

ATLAS SCT Module Test Run 1 Burst 183 Date 20000508 Time 190152

Run Trigs_sent 146400 Events_seen 146400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190

ATLAS SCT Module Test Run 1 Burst 184 Date 20000508 Time 190153

Run Trigs_sent 147200 Events_seen 147200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195

ATLAS SCT Module Test Run 1 Burst 185 Date 20000508 Time 190154

Run Trigs_sent 148000 Events_seen 148000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200

ATLAS SCT Module Test Run 1 Burst 186 Date 20000508 Time 190155

Run Trigs_sent 148800 Events_seen 148800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205

ATLAS SCT Module Test Run 1 Burst 187 Date 20000508 Time 190156

Run Trigs_sent 149600 Events_seen 149600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210

ATLAS SCT Module Test Run 1 Burst 188 Date 20000508 Time 190157

Run Trigs_sent 150400 Events_seen 150400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215

ATLAS SCT Module Test Run 1 Burst 189 Date 20000508 Time 190158

Run Trigs_sent 151200 Events_seen 151200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220

ATLAS SCT Module Test Run 1 Burst 190 Date 20000508 Time 190200

Run Trigs_sent 152000 Events_seen 152000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225

ATLAS SCT Module Test Run 1 Burst 191 Date 20000508 Time 190201

Run Trigs_sent 152800 Events_seen 152800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230

ATLAS SCT Module Test Run 1 Burst 192 Date 20000508 Time 190202

Run Trigs_sent 153600 Events_seen 153600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235

ATLAS SCT Module Test Run 1 Burst 193 Date 20000508 Time 190204

Run Trigs_sent 154400 Events_seen 154400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240

ATLAS SCT Module Test Run 1 Burst 194 Date 20000508 Time 190205

Run Trigs_sent 155200 Events_seen 155200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245

ATLAS SCT Module Test Run 1 Burst 195 Date 20000508 Time 190206

Run Trigs_sent 156000 Events_seen 156000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250

ATLAS SCT Module Test Run 1 Burst 196 Date 20000508 Time 190207

Run Trigs_sent 156800 Events_seen 156800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255

ATLAS SCT Module Test Run 1 Burst 197 Date 20000508 Time 190208

Run Trigs_sent 157600 Events_seen 157600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260

ATLAS SCT Module Test Run 1 Burst 198 Date 20000508 Time 190209

Run Trigs_sent 158400 Events_seen 158400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265

ATLAS SCT Module Test Run 1 Burst 199 Date 20000508 Time 190210

Run Trigs_sent 159200 Events_seen 159200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270

ATLAS SCT Module Test Run 1 Burst 200 Date 20000508 Time 190211

Run Trigs_sent 160000 Events_seen 160000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275

ATLAS SCT Module Test Run 1 Burst 201 Date 20000508 Time 190212

Run Trigs_sent 160800 Events_seen 160800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280

ATLAS SCT Module Test Run 1 Burst 202 Date 20000508 Time 190213

Run Trigs_sent 161600 Events_seen 161600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140 160 180

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285

ATLAS SCT Module Test Run 1 Burst 203 Date 20000508 Time 190215

Run Trigs_sent 162400 Events_seen 162400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

20

40

60

80

100

120

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290

ATLAS SCT Module Test Run 1 Burst 204 Date 20000508 Time 190216

Run Trigs_sent 163200 Events_seen 163200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

10

20

30

40

50

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295

ATLAS SCT Module Test Run 1 Burst 205 Date 20000508 Time 190217

Run Trigs_sent 164000 Events_seen 164000 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 1 2 3 4 5 6 7 8

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 205 Date 20000508 Time 190220

0

0 0 1 2 3 4 5 6 7 8

0

1

0

1

0

1

0

1

Run Trigs_sent 164000 Events_seen 164000 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 206 Date 20000508 Time 190221

Run Trigs_sent 164800 Events_seen 164800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 207 Date 20000508 Time 190222

Run Trigs_sent 165600 Events_seen 165600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 208 Date 20000508 Time 190223

Run Trigs_sent 166400 Events_seen 166400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 209 Date 20000508 Time 190224

Run Trigs_sent 167200 Events_seen 167200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 210 Date 20000508 Time 190225

Run Trigs_sent 168000 Events_seen 168000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 211 Date 20000508 Time 190226

Run Trigs_sent 168800 Events_seen 168800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

800

Mustard Counters

h_merr

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 0 Burst Data

h_burst0

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 1 Burst Data

h_burst1

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 1 Burst Data

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 212 Date 20000508 Time 190227

Run Trigs_sent 169600 Events_seen 169600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 6 set 180 req 180

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0

100

200

300

400

500

600

700

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 213 Date 20000508 Time 190229

Run Trigs_sent 170400 Events_seen 170400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 7 set 185 req 185

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 214 Date 20000508 Time 190230

Run Trigs_sent 171200 Events_seen 171200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 8 set 190 req 190

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 215 Date 20000508 Time 190231

Run Trigs_sent 172000 Events_seen 172000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 9 set 195 req 195

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 216 Date 20000508 Time 190233

Run Trigs_sent 172800 Events_seen 172800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 10 set 200 req 200

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 217 Date 20000508 Time 190234

Run Trigs_sent 173600 Events_seen 173600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 11 set 205 req 205

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 218 Date 20000508 Time 190235

Run Trigs_sent 174400 Events_seen 174400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 12 set 210 req 210

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 219 Date 20000508 Time 190236

Run Trigs_sent 175200 Events_seen 175200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 13 set 215 req 215

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 220 Date 20000508 Time 190237

Run Trigs_sent 176000 Events_seen 176000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 14 set 220 req 220

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 221 Date 20000508 Time 190238

Run Trigs_sent 176800 Events_seen 176800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 15 set 225 req 225

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 222 Date 20000508 Time 190239

Run Trigs_sent 177600 Events_seen 177600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 16 set 230 req 230

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 223 Date 20000508 Time 190240

Run Trigs_sent 178400 Events_seen 178400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 17 set 235 req 235

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 224 Date 20000508 Time 190242

Run Trigs_sent 179200 Events_seen 179200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 18 set 240 req 240

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 225 Date 20000508 Time 190243

Run Trigs_sent 180000 Events_seen 180000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 19 set 245 req 245

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 226 Date 20000508 Time 190244

Run Trigs_sent 180800 Events_seen 180800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 20 set 250 req 250

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 227 Date 20000508 Time 190245

Run Trigs_sent 181600 Events_seen 181600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 21 set 255 req 255

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 228 Date 20000508 Time 190246

Run Trigs_sent 182400 Events_seen 182400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 22 set 260 req 260

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 229 Date 20000508 Time 190247

Run Trigs_sent 183200 Events_seen 183200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 23 set 265 req 265

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 230 Date 20000508 Time 190248

Run Trigs_sent 184000 Events_seen 184000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 24 set 270 req 270

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 231 Date 20000508 Time 190249

Run Trigs_sent 184800 Events_seen 184800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 25 set 275 req 275

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 232 Date 20000508 Time 190250

Run Trigs_sent 185600 Events_seen 185600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 26 set 280 req 280

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 233 Date 20000508 Time 190251

Run Trigs_sent 186400 Events_seen 186400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 27 set 285 req 285

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 234 Date 20000508 Time 190252

Run Trigs_sent 187200 Events_seen 187200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 28 set 290 req 290

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 235 Date 20000508 Time 190253

Run Trigs_sent 188000 Events_seen 188000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 29 set 295 req 295

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 236 Date 20000508 Time 190254

Run Trigs_sent 188800 Events_seen 188800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 30 set 300 req 300

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 237 Date 20000508 Time 190255

Run Trigs_sent 189600 Events_seen 189600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 31 set 305 req 305

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 238 Date 20000508 Time 190256

Run Trigs_sent 190400 Events_seen 190400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 32 set 310 req 310

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 239 Date 20000508 Time 190257

Run Trigs_sent 191200 Events_seen 191200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 33 set 315 req 315

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 240 Date 20000508 Time 190258

Run Trigs_sent 192000 Events_seen 192000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 34 set 320 req 320

0

0 0

20

40

60

80

100

120

140

160

180

200

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 241 Date 20000508 Time 190259

Run Trigs_sent 192800 Events_seen 192800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 35 set 325 req 325

0

0 0

20

40

60

80

100

120

140

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 242 Date 20000508 Time 190300

Run Trigs_sent 193600 Events_seen 193600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 36 set 330 req 330

0

0 0

5

10

15

20

25

30

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 243 Date 20000508 Time 190302

Run Trigs_sent 194400 Events_seen 194400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 37 set 335 req 335

0

0

-1

-0.5

0

0.5

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 244 Date 20000508 Time 190303

Run Trigs_sent 195200 Events_seen 195200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 38 set 340 req 340

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 245 Date 20000508 Time 190304

Run Trigs_sent 196000 Events_seen 196000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 39 set 345 req 345

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 246 Date 20000508 Time 190305

Run Trigs_sent 196800 Events_seen 196800 Stream_errors 0 Timeouts 0 Other_errors 0

0

0

20

40

60

80

100

120

140

160

0

1

0

1

0

1

0

1

0

1