ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 6 Charge 3.00fC) - (Run 1 Scan 5 Charge 2.00fC)

Channel Number

100 200 300 400 500 600 700

Gain at 2.50fC (mV/fC)

48

50

52

54

56

58 Gain (mV/fC)

Channel Number

100 200 300 400 500 600 700

Offset at 2.50fC (mV)

90

100

110

120

130

140 Offset (mV)

Channel Number

100 200 300 400 500 600 700

Input Noise at 2.50fC (ENC)

500

550

600

650

700 Noise (ENC)

Gain at 2.50fC (mV/fC)

40 45 50 55 60 65 70 75 80 n(Gain)

0

20

40

60

80

100

120

140

160

180

200 Gain, all channels

Offset at 2.50fC (mV)

0 20 40 60 80 100 120 140 n(Offset)

0

20

40

60

80

100

Offset, all channels

Input Noise at 2.50fC (ENC)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 n(Noise)

0

50

100

150

200

250

300

350

400 Noise, all channels

ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 6 Charge 3.00fC) - (Run 1 Scan 5 Charge 2.00fC)

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0 2 4 6 8 10 12 14 16 18 20 22 24 Gain, chip 0

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

2

4

6

8

10

12

Gain, chip 1

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0 2

4

6

8

10

12

14

16

18 20

22 Gain, chip 2

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

2

4

6

8

10

12

14 Gain, chip 3

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0 2 4 6 8 10 12 14 16 18 20 22 Gain, chip 4

Gain(mV/fC)

48 50 52 54 56 58

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 5

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

5

10

15

20

25

30 Offset, chip 0

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

Offset, chip 1

Offset(mV)

90 100 110 120 130 140

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 Offset, chip 2

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 3

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

12

14

16 Offset, chip 4

Offset(mV)

90 100 110 120 130 140

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 5

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

18

Input Noise, chip 0

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 1

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

Input Noise, chip 2

Noise(ENC)

500 550 600 650 700

N(Mean)

0 2

4

6

8

10

12

14

16

18 20

22 Input Noise, chip 3

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

18 Input Noise, chip 4

Noise(ENC)

500 550 600 650 700

N(Mean)

0

2

4

6

8

10

12

14

16

Input Noise, chip 5

ATLAS SCT Module Test Run 1 Burst 246 Date 20000508 Time 190419 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 196800 Events_seen 196800 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0 100 200 300 400 500 600 700 800 Mustard Counters h_merr Nent = 20

Channel Number

0 100 200 300 400 500 600 700

Hits

0 20 40 60 80 100 120 140 160 Module 0 Stream 0 Burst Data h_burst0 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 0 Stream 1 Burst Data h_burst1 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 1 Burst Data

Run Trigs_sent 196800 Events_seen 196800 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 247 Date 20000508 Time 190420 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 197600 Events_seen 197600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 20 40 60 80 100 120 140 160 180 200

0 20 40 60 80 100 120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100

ATLAS SCT Module Test Run 1 Burst 248 Date 20000508 Time 190421

Run Trigs_sent 198400 Events_seen 198400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105

ATLAS SCT Module Test Run 1 Burst 249 Date 20000508 Time 190422

Run Trigs_sent 199200 Events_seen 199200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110

ATLAS SCT Module Test Run 1 Burst 250 Date 20000508 Time 190423

Run Trigs_sent 200000 Events_seen 200000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115

ATLAS SCT Module Test Run 1 Burst 251 Date 20000508 Time 190424

Run Trigs_sent 200800 Events_seen 200800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120

ATLAS SCT Module Test Run 1 Burst 252 Date 20000508 Time 190424

Run Trigs_sent 201600 Events_seen 201600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125

ATLAS SCT Module Test Run 1 Burst 253 Date 20000508 Time 190425

Run Trigs_sent 202400 Events_seen 202400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130

ATLAS SCT Module Test Run 1 Burst 254 Date 20000508 Time 190426

Run Trigs_sent 203200 Events_seen 203200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135

ATLAS SCT Module Test Run 1 Burst 255 Date 20000508 Time 190427

Run Trigs_sent 204000 Events_seen 204000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140

ATLAS SCT Module Test Run 1 Burst 256 Date 20000508 Time 190428

Run Trigs_sent 204800 Events_seen 204800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145

ATLAS SCT Module Test Run 1 Burst 257 Date 20000508 Time 190429

Run Trigs_sent 205600 Events_seen 205600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 258 Date 20000508 Time 190430

Run Trigs_sent 206400 Events_seen 206400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 259 Date 20000508 Time 190431

Run Trigs_sent 207200 Events_seen 207200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 260 Date 20000508 Time 190432

Run Trigs_sent 208000 Events_seen 208000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 261 Date 20000508 Time 190433

Run Trigs_sent 208800 Events_seen 208800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 262 Date 20000508 Time 190434

Run Trigs_sent 209600 Events_seen 209600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 263 Date 20000508 Time 190435

Run Trigs_sent 210400 Events_seen 210400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180

ATLAS SCT Module Test Run 1 Burst 264 Date 20000508 Time 190436

Run Trigs_sent 211200 Events_seen 211200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185

ATLAS SCT Module Test Run 1 Burst 265 Date 20000508 Time 190437

Run Trigs_sent 212000 Events_seen 212000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190

ATLAS SCT Module Test Run 1 Burst 266 Date 20000508 Time 190438

Run Trigs_sent 212800 Events_seen 212800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195

ATLAS SCT Module Test Run 1 Burst 267 Date 20000508 Time 190439

Run Trigs_sent 213600 Events_seen 213600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200

ATLAS SCT Module Test Run 1 Burst 268 Date 20000508 Time 190440

Run Trigs_sent 214400 Events_seen 214400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205

ATLAS SCT Module Test Run 1 Burst 269 Date 20000508 Time 190441

Run Trigs_sent 215200 Events_seen 215200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210

ATLAS SCT Module Test Run 1 Burst 270 Date 20000508 Time 190442

Run Trigs_sent 216000 Events_seen 216000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215

ATLAS SCT Module Test Run 1 Burst 271 Date 20000508 Time 190443

Run Trigs_sent 216800 Events_seen 216800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220

ATLAS SCT Module Test Run 1 Burst 272 Date 20000508 Time 190444

Run Trigs_sent 217600 Events_seen 217600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225

ATLAS SCT Module Test Run 1 Burst 273 Date 20000508 Time 190445

Run Trigs_sent 218400 Events_seen 218400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230

ATLAS SCT Module Test Run 1 Burst 274 Date 20000508 Time 190446

Run Trigs_sent 219200 Events_seen 219200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235

ATLAS SCT Module Test Run 1 Burst 275 Date 20000508 Time 190447

Run Trigs_sent 220000 Events_seen 220000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240

ATLAS SCT Module Test Run 1 Burst 276 Date 20000508 Time 190448

Run Trigs_sent 220800 Events_seen 220800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245

ATLAS SCT Module Test Run 1 Burst 277 Date 20000508 Time 190449

Run Trigs_sent 221600 Events_seen 221600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250

ATLAS SCT Module Test Run 1 Burst 278 Date 20000508 Time 190450

Run Trigs_sent 222400 Events_seen 222400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255

ATLAS SCT Module Test Run 1 Burst 279 Date 20000508 Time 190451

Run Trigs_sent 223200 Events_seen 223200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260

ATLAS SCT Module Test Run 1 Burst 280 Date 20000508 Time 190452

Run Trigs_sent 224000 Events_seen 224000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265

ATLAS SCT Module Test Run 1 Burst 281 Date 20000508 Time 190453

Run Trigs_sent 224800 Events_seen 224800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270

ATLAS SCT Module Test Run 1 Burst 282 Date 20000508 Time 190454

Run Trigs_sent 225600 Events_seen 225600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275

ATLAS SCT Module Test Run 1 Burst 283 Date 20000508 Time 190455

Run Trigs_sent 226400 Events_seen 226400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280

ATLAS SCT Module Test Run 1 Burst 284 Date 20000508 Time 190456

Run Trigs_sent 227200 Events_seen 227200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

40 60 80 100 120 140 160 180

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285

ATLAS SCT Module Test Run 1 Burst 285 Date 20000508 Time 190457

Run Trigs_sent 228000 Events_seen 228000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290

ATLAS SCT Module Test Run 1 Burst 286 Date 20000508 Time 190458

Run Trigs_sent 228800 Events_seen 228800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 5 10 15 20 25 30 35 40 45

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295

ATLAS SCT Module Test Run 1 Burst 287 Date 20000508 Time 190459

Run Trigs_sent 229600 Events_seen 229600 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 1 2 3 4 5 6 7 8

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 287 Date 20000508 Time 190502

0

0 0 1 2 3 4 5 6 7 8

0

1

0

1

0

1

0

1

Run Trigs_sent 229600 Events_seen 229600 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 288 Date 20000508 Time 190503

Run Trigs_sent 230400 Events_seen 230400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 289 Date 20000508 Time 190504

Run Trigs_sent 231200 Events_seen 231200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 290 Date 20000508 Time 190505

Run Trigs_sent 232000 Events_seen 232000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 291 Date 20000508 Time 190506

Run Trigs_sent 232800 Events_seen 232800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 292 Date 20000508 Time 190507

Run Trigs_sent 233600 Events_seen 233600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 293 Date 20000508 Time 190508

Run Trigs_sent 234400 Events_seen 234400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

600

700

800

Mustard Counters

h_merr

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 0 Burst Data

h_burst0

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 1 Burst Data

h_burst1

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 1 Burst Data

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 294 Date 20000508 Time 190509

Run Trigs_sent 235200 Events_seen 235200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 6 set 180 req 180

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0

100

200

300

400

500

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 295 Date 20000508 Time 190509

Run Trigs_sent 236000 Events_seen 236000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 7 set 185 req 185

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 296 Date 20000508 Time 190510

Run Trigs_sent 236800 Events_seen 236800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 8 set 190 req 190

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 297 Date 20000508 Time 190511

Run Trigs_sent 237600 Events_seen 237600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 9 set 195 req 195

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 298 Date 20000508 Time 190512

Run Trigs_sent 238400 Events_seen 238400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 10 set 200 req 200

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 299 Date 20000508 Time 190513

Run Trigs_sent 239200 Events_seen 239200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 11 set 205 req 205

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 300 Date 20000508 Time 190514

Run Trigs_sent 240000 Events_seen 240000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 12 set 210 req 210

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 301 Date 20000508 Time 190515

Run Trigs_sent 240800 Events_seen 240800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 13 set 215 req 215

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 302 Date 20000508 Time 190516

Run Trigs_sent 241600 Events_seen 241600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 14 set 220 req 220

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 303 Date 20000508 Time 190517

Run Trigs_sent 242400 Events_seen 242400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 15 set 225 req 225

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 304 Date 20000508 Time 190518

Run Trigs_sent 243200 Events_seen 243200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 16 set 230 req 230

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 305 Date 20000508 Time 190519

Run Trigs_sent 244000 Events_seen 244000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 17 set 235 req 235

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 306 Date 20000508 Time 190520

Run Trigs_sent 244800 Events_seen 244800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 18 set 240 req 240

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 307 Date 20000508 Time 190521

Run Trigs_sent 245600 Events_seen 245600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 19 set 245 req 245

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 308 Date 20000508 Time 190522

Run Trigs_sent 246400 Events_seen 246400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 20 set 250 req 250

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 309 Date 20000508 Time 190523

Run Trigs_sent 247200 Events_seen 247200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 21 set 255 req 255

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 310 Date 20000508 Time 190524

Run Trigs_sent 248000 Events_seen 248000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 22 set 260 req 260

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 311 Date 20000508 Time 190525

Run Trigs_sent 248800 Events_seen 248800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 23 set 265 req 265

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 312 Date 20000508 Time 190526

Run Trigs_sent 249600 Events_seen 249600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 24 set 270 req 270

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 313 Date 20000508 Time 190527

Run Trigs_sent 250400 Events_seen 250400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 25 set 275 req 275

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 314 Date 20000508 Time 190528

Run Trigs_sent 251200 Events_seen 251200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 26 set 280 req 280

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 315 Date 20000508 Time 190529

Run Trigs_sent 252000 Events_seen 252000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 27 set 285 req 285

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 316 Date 20000508 Time 190530

Run Trigs_sent 252800 Events_seen 252800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 28 set 290 req 290

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 317 Date 20000508 Time 190531

Run Trigs_sent 253600 Events_seen 253600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 29 set 295 req 295

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 318 Date 20000508 Time 190532

Run Trigs_sent 254400 Events_seen 254400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 30 set 300 req 300

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 319 Date 20000508 Time 190533

Run Trigs_sent 255200 Events_seen 255200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 31 set 305 req 305

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 320 Date 20000508 Time 190534

Run Trigs_sent 256000 Events_seen 256000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 32 set 310 req 310

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 321 Date 20000508 Time 190535

Run Trigs_sent 256800 Events_seen 256800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 33 set 315 req 315

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 322 Date 20000508 Time 190537

Run Trigs_sent 257600 Events_seen 257600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 34 set 320 req 320

0

0 0

20

40

60

80

100

120

140

160

180

200

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 323 Date 20000508 Time 190538

Run Trigs_sent 258400 Events_seen 258400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 35 set 325 req 325

0

0 0

20

40

60

80

100

120

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 324 Date 20000508 Time 190539

Run Trigs_sent 259200 Events_seen 259200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 36 set 330 req 330

0

0 0

5

10

15

20

25

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 325 Date 20000508 Time 190540

Run Trigs_sent 260000 Events_seen 260000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 37 set 335 req 335

0

0

-1

-0.5

0

0.5

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 326 Date 20000508 Time 190541

Run Trigs_sent 260800 Events_seen 260800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 38 set 340 req 340

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 327 Date 20000508 Time 190542

Run Trigs_sent 261600 Events_seen 261600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 39 set 345 req 345

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 328 Date 20000508 Time 190543

Run Trigs_sent 262400 Events_seen 262400 Stream_errors 0 Timeouts 0 Other_errors 0

0

0

20

40

60

80

100

120

140

160

0

1

0

1

0

1

0

1

0

1