ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 20 Charge 3.00fC) - (Run 1 Scan 19 Charge 2.00fC)

Channel Number

100 200 300 400 500 600 700

Gain at 2.50fC (mV/fC)

42

44

46

48

50

52 Gain (mV/fC)

Channel Number

100 200 300 400 500 600 700

Offset at 2.50fC (mV)

80

90

100

110

120

130 Offset (mV)

Channel Number

100 200 300 400 500 600 700

Input Noise at 2.50fC (ENC)

500

550

600

650

700

750 Noise (ENC)

Gain at 2.50fC (mV/fC)

40 45 50 55 60 65 70 75 80 n(Gain)

0 20 40 60 80 100 120 140 160 180 200 220 Gain, all channels

Offset at 2.50fC (mV)

0 20 40 60 80 100 120 140 n(Offset)

0

20

40

60

80

100

Offset, all channels

Input Noise at 2.50fC (ENC)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 n(Noise)

0

50

100

150

200

250

300

350

400 Noise, all channels

ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 20 Charge 3.00fC) - (Run 1 Scan 19 Charge 2.00fC)

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0 2 4 6 8 10 12 14 16 18 20 22 Gain, chip 0

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14 Gain, chip 1

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14 Gain, chip 2

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14

16 Gain, chip 3

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 4

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 5

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 24 Offset, chip 0

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12 Offset, chip 1

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 Offset, chip 2

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16

18

20 Offset, chip 3

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16 Offset, chip 4

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 Offset, chip 5

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 0

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18

Input Noise, chip 1

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

Input Noise, chip 2

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18 Input Noise, chip 3

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18

Input Noise, chip 4

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 5

ATLAS SCT Module Test Run 1 Burst 820 Date 20000508 Time 195305 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 656000 Events_seen 656000 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0 100 200 300 400 500 600 700 800 Mustard Counters h_merr Nent = 20

Channel Number

0 100 200 300 400 500 600 700

Hits

0 20 40 60 80 100 120 140 160 180 200 Module 0 Stream 0 Burst Data h_burst0 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 0 Stream 1 Burst Data h_burst1 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 1 Burst Data

Run Trigs_sent 656000 Events_seen 656000 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 821 Date 20000508 Time 195306 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 656800 Events_seen 656800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100

ATLAS SCT Module Test Run 1 Burst 822 Date 20000508 Time 195307

Run Trigs_sent 657600 Events_seen 657600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105

ATLAS SCT Module Test Run 1 Burst 823 Date 20000508 Time 195308

Run Trigs_sent 658400 Events_seen 658400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110

ATLAS SCT Module Test Run 1 Burst 824 Date 20000508 Time 195309

Run Trigs_sent 659200 Events_seen 659200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115

ATLAS SCT Module Test Run 1 Burst 825 Date 20000508 Time 195310

Run Trigs_sent 660000 Events_seen 660000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120

ATLAS SCT Module Test Run 1 Burst 826 Date 20000508 Time 195311

Run Trigs_sent 660800 Events_seen 660800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125

ATLAS SCT Module Test Run 1 Burst 827 Date 20000508 Time 195312

Run Trigs_sent 661600 Events_seen 661600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130

ATLAS SCT Module Test Run 1 Burst 828 Date 20000508 Time 195313

Run Trigs_sent 662400 Events_seen 662400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135

ATLAS SCT Module Test Run 1 Burst 829 Date 20000508 Time 195313

Run Trigs_sent 663200 Events_seen 663200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140

ATLAS SCT Module Test Run 1 Burst 830 Date 20000508 Time 195314

Run Trigs_sent 664000 Events_seen 664000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145

ATLAS SCT Module Test Run 1 Burst 831 Date 20000508 Time 195315

Run Trigs_sent 664800 Events_seen 664800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 832 Date 20000508 Time 195316

Run Trigs_sent 665600 Events_seen 665600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 833 Date 20000508 Time 195317

Run Trigs_sent 666400 Events_seen 666400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 834 Date 20000508 Time 195318

Run Trigs_sent 667200 Events_seen 667200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 835 Date 20000508 Time 195319

Run Trigs_sent 668000 Events_seen 668000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 836 Date 20000508 Time 195320

Run Trigs_sent 668800 Events_seen 668800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 837 Date 20000508 Time 195321

Run Trigs_sent 669600 Events_seen 669600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180

ATLAS SCT Module Test Run 1 Burst 838 Date 20000508 Time 195322

Run Trigs_sent 670400 Events_seen 670400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185

ATLAS SCT Module Test Run 1 Burst 839 Date 20000508 Time 195323

Run Trigs_sent 671200 Events_seen 671200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190

ATLAS SCT Module Test Run 1 Burst 840 Date 20000508 Time 195324

Run Trigs_sent 672000 Events_seen 672000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195

ATLAS SCT Module Test Run 1 Burst 841 Date 20000508 Time 195325

Run Trigs_sent 672800 Events_seen 672800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200

ATLAS SCT Module Test Run 1 Burst 842 Date 20000508 Time 195326

Run Trigs_sent 673600 Events_seen 673600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205

ATLAS SCT Module Test Run 1 Burst 843 Date 20000508 Time 195327

Run Trigs_sent 674400 Events_seen 674400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210

ATLAS SCT Module Test Run 1 Burst 844 Date 20000508 Time 195328

Run Trigs_sent 675200 Events_seen 675200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215

ATLAS SCT Module Test Run 1 Burst 845 Date 20000508 Time 195329

Run Trigs_sent 676000 Events_seen 676000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220

ATLAS SCT Module Test Run 1 Burst 846 Date 20000508 Time 195330

Run Trigs_sent 676800 Events_seen 676800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225

ATLAS SCT Module Test Run 1 Burst 847 Date 20000508 Time 195331

Run Trigs_sent 677600 Events_seen 677600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230

ATLAS SCT Module Test Run 1 Burst 848 Date 20000508 Time 195332

Run Trigs_sent 678400 Events_seen 678400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235

ATLAS SCT Module Test Run 1 Burst 849 Date 20000508 Time 195333

Run Trigs_sent 679200 Events_seen 679200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240

ATLAS SCT Module Test Run 1 Burst 850 Date 20000508 Time 195334

Run Trigs_sent 680000 Events_seen 680000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245

ATLAS SCT Module Test Run 1 Burst 851 Date 20000508 Time 195336

Run Trigs_sent 680800 Events_seen 680800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250

ATLAS SCT Module Test Run 1 Burst 852 Date 20000508 Time 195337

Run Trigs_sent 681600 Events_seen 681600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255

ATLAS SCT Module Test Run 1 Burst 853 Date 20000508 Time 195338

Run Trigs_sent 682400 Events_seen 682400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260

ATLAS SCT Module Test Run 1 Burst 854 Date 20000508 Time 195339

Run Trigs_sent 683200 Events_seen 683200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265

ATLAS SCT Module Test Run 1 Burst 855 Date 20000508 Time 195340

Run Trigs_sent 684000 Events_seen 684000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140 160

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270

ATLAS SCT Module Test Run 1 Burst 856 Date 20000508 Time 195341

Run Trigs_sent 684800 Events_seen 684800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 5 10 15 20 25 30 35 40 45

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275

ATLAS SCT Module Test Run 1 Burst 857 Date 20000508 Time 195342

Run Trigs_sent 685600 Events_seen 685600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0.5

1

1.5

2

2.5

3

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280

ATLAS SCT Module Test Run 1 Burst 858 Date 20000508 Time 195343

Run Trigs_sent 686400 Events_seen 686400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285

ATLAS SCT Module Test Run 1 Burst 859 Date 20000508 Time 195344

Run Trigs_sent 687200 Events_seen 687200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290

ATLAS SCT Module Test Run 1 Burst 860 Date 20000508 Time 195345

Run Trigs_sent 688000 Events_seen 688000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295

ATLAS SCT Module Test Run 1 Burst 861 Date 20000508 Time 195346

Run Trigs_sent 688800 Events_seen 688800 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 861 Date 20000508 Time 195349

0

0

0

1

0

1

0

1

0

1

0

1

Run Trigs_sent 688800 Events_seen 688800 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 862 Date 20000508 Time 195350

Run Trigs_sent 689600 Events_seen 689600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 863 Date 20000508 Time 195351

Run Trigs_sent 690400 Events_seen 690400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 864 Date 20000508 Time 195352

Run Trigs_sent 691200 Events_seen 691200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 865 Date 20000508 Time 195353

Run Trigs_sent 692000 Events_seen 692000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 866 Date 20000508 Time 195354

Run Trigs_sent 692800 Events_seen 692800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 867 Date 20000508 Time 195355

Run Trigs_sent 693600 Events_seen 693600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 0 Burst Data

h_burst0

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 1 Burst Data

h_burst1

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 1 Burst Data

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 868 Date 20000508 Time 195356

Run Trigs_sent 694400 Events_seen 694400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 6 set 180 req 180

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0

100

200

300

400

500

600

700

800

Mustard Counters

h_merr

Channel Number

0 100 200 300 400 500 600 700

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 869 Date 20000508 Time 195357

Run Trigs_sent 695200 Events_seen 695200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 7 set 185 req 185

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 870 Date 20000508 Time 195358

Run Trigs_sent 696000 Events_seen 696000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 8 set 190 req 190

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 871 Date 20000508 Time 195359

Run Trigs_sent 696800 Events_seen 696800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 9 set 195 req 195

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 872 Date 20000508 Time 195400

Run Trigs_sent 697600 Events_seen 697600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 10 set 200 req 200

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 873 Date 20000508 Time 195401

Run Trigs_sent 698400 Events_seen 698400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 11 set 205 req 205

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 874 Date 20000508 Time 195402

Run Trigs_sent 699200 Events_seen 699200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 12 set 210 req 210

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 875 Date 20000508 Time 195403

Run Trigs_sent 700000 Events_seen 700000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 13 set 215 req 215

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 876 Date 20000508 Time 195404

Run Trigs_sent 700800 Events_seen 700800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 14 set 220 req 220

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 877 Date 20000508 Time 195405

Run Trigs_sent 701600 Events_seen 701600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 15 set 225 req 225

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 878 Date 20000508 Time 195406

Run Trigs_sent 702400 Events_seen 702400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 16 set 230 req 230

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 879 Date 20000508 Time 195407

Run Trigs_sent 703200 Events_seen 703200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 17 set 235 req 235

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 880 Date 20000508 Time 195408

Run Trigs_sent 704000 Events_seen 704000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 18 set 240 req 240

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 881 Date 20000508 Time 195409

Run Trigs_sent 704800 Events_seen 704800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 19 set 245 req 245

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 882 Date 20000508 Time 195410

Run Trigs_sent 705600 Events_seen 705600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 20 set 250 req 250

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 883 Date 20000508 Time 195411

Run Trigs_sent 706400 Events_seen 706400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 21 set 255 req 255

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 884 Date 20000508 Time 195412

Run Trigs_sent 707200 Events_seen 707200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 22 set 260 req 260

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 885 Date 20000508 Time 195413

Run Trigs_sent 708000 Events_seen 708000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 23 set 265 req 265

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 886 Date 20000508 Time 195414

Run Trigs_sent 708800 Events_seen 708800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 24 set 270 req 270

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 887 Date 20000508 Time 195415

Run Trigs_sent 709600 Events_seen 709600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 25 set 275 req 275

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 888 Date 20000508 Time 195416

Run Trigs_sent 710400 Events_seen 710400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 26 set 280 req 280

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 889 Date 20000508 Time 195417

Run Trigs_sent 711200 Events_seen 711200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 27 set 285 req 285

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 890 Date 20000508 Time 195418

Run Trigs_sent 712000 Events_seen 712000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 28 set 290 req 290

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 891 Date 20000508 Time 195419

Run Trigs_sent 712800 Events_seen 712800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 29 set 295 req 295

0

0 0

20

40

60

80

100

120

140

160

180

200

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 892 Date 20000508 Time 195420

Run Trigs_sent 713600 Events_seen 713600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 30 set 300 req 300

0

0 0

10

20

30

40

50

60

70

80

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 893 Date 20000508 Time 195421

Run Trigs_sent 714400 Events_seen 714400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 31 set 305 req 305

0

0 0

0.2

0.4

0.6

0.8

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 894 Date 20000508 Time 195422

Run Trigs_sent 715200 Events_seen 715200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 32 set 310 req 310

0

0

-1

-0.5

0

0.5

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 895 Date 20000508 Time 195423

Run Trigs_sent 716000 Events_seen 716000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 33 set 315 req 315

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 896 Date 20000508 Time 195424

Run Trigs_sent 716800 Events_seen 716800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 34 set 320 req 320

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 897 Date 20000508 Time 195425

Run Trigs_sent 717600 Events_seen 717600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 35 set 325 req 325

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 898 Date 20000508 Time 195426

Run Trigs_sent 718400 Events_seen 718400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 36 set 330 req 330

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 899 Date 20000508 Time 195427

Run Trigs_sent 719200 Events_seen 719200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 37 set 335 req 335

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 900 Date 20000508 Time 195428

Run Trigs_sent 720000 Events_seen 720000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 38 set 340 req 340

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 901 Date 20000508 Time 195429

Run Trigs_sent 720800 Events_seen 720800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 39 set 345 req 345

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 902 Date 20000508 Time 195430

Run Trigs_sent 721600 Events_seen 721600 Stream_errors 0 Timeouts 0 Other_errors 0

0

0

0

1

0

1

0

1

0

1

0

1