ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 22 Charge 3.00fC) - (Run 1 Scan 21 Charge 2.00fC)

Channel Number

100 200 300 400 500 600 700

Gain at 2.50fC (mV/fC)

42

44

46

48

50 Gain (mV/fC)

Channel Number

100 200 300 400 500 600 700

Offset at 2.50fC (mV)

80

90

100

110

120

130 Offset (mV)

Channel Number

100 200 300 400 500 600 700

Input Noise at 2.50fC (ENC)

500

550

600

650

700

750 Noise (ENC)

Gain at 2.50fC (mV/fC)

40 45 50 55 60 65 70 75 80 n(Gain)

0 20 40 60 80 100 120 140 160 180 200 220 Gain, all channels

Offset at 2.50fC (mV)

0 20 40 60 80 100 120 140 n(Offset)

0

20

40

60

80

100

120

Offset, all channels

Input Noise at 2.50fC (ENC)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 n(Noise)

0

50

100

150

200

250

300

350

400 Noise, all channels

ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 22 Charge 3.00fC) - (Run 1 Scan 21 Charge 2.00fC)

Gain(mV/fC)

42 44 46 48 50

N(Gain)

0

2

4

6

8

10

12

14

16

18

20 Gain, chip 0

Gain(mV/fC)

42 44 46 48 50

N(Gain)

0

2

4

6

8

10

12

14

16 Gain, chip 1

Gain(mV/fC)

42 44 46 48 50

N(Gain)

0

2

4

6

8

10

12

14

16 Gain, chip 2

Gain(mV/fC)

42 44 46 48 50

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 3

Gain(mV/fC)

42 44 46 48 50

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 4

Gain(mV/fC)

42 44 46 48 50

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 5

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

5

10

15

20

25 Offset, chip 0

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16 Offset, chip 1

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 Offset, chip 2

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 3

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16 Offset, chip 4

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 5

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18 Input Noise, chip 0

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18 Input Noise, chip 1

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 2

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 3

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

Input Noise, chip 4

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

Input Noise, chip 5

ATLAS SCT Module Test Run 1 Burst 902 Date 20000508 Time 195545 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 721600 Events_seen 721600 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0 100 200 300 400 500 600 700 800 Mustard Counters h_merr Nent = 20

Channel Number

0 100 200 300 400 500 600 700

Hits

0 20 40 60 80 100 120 140 160 180 200 Module 0 Stream 0 Burst Data h_burst0 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 0 Stream 1 Burst Data h_burst1 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 1 Burst Data

Run Trigs_sent 721600 Events_seen 721600 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 903 Date 20000508 Time 195546 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 722400 Events_seen 722400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100

ATLAS SCT Module Test Run 1 Burst 904 Date 20000508 Time 195546

Run Trigs_sent 723200 Events_seen 723200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105

ATLAS SCT Module Test Run 1 Burst 905 Date 20000508 Time 195547

Run Trigs_sent 724000 Events_seen 724000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110

ATLAS SCT Module Test Run 1 Burst 906 Date 20000508 Time 195548

Run Trigs_sent 724800 Events_seen 724800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115

ATLAS SCT Module Test Run 1 Burst 907 Date 20000508 Time 195549

Run Trigs_sent 725600 Events_seen 725600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120

ATLAS SCT Module Test Run 1 Burst 908 Date 20000508 Time 195550

Run Trigs_sent 726400 Events_seen 726400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125

ATLAS SCT Module Test Run 1 Burst 909 Date 20000508 Time 195551

Run Trigs_sent 727200 Events_seen 727200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130

ATLAS SCT Module Test Run 1 Burst 910 Date 20000508 Time 195552

Run Trigs_sent 728000 Events_seen 728000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135

ATLAS SCT Module Test Run 1 Burst 911 Date 20000508 Time 195553

Run Trigs_sent 728800 Events_seen 728800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140

ATLAS SCT Module Test Run 1 Burst 912 Date 20000508 Time 195554

Run Trigs_sent 729600 Events_seen 729600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145

ATLAS SCT Module Test Run 1 Burst 913 Date 20000508 Time 195555

Run Trigs_sent 730400 Events_seen 730400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 914 Date 20000508 Time 195556

Run Trigs_sent 731200 Events_seen 731200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 915 Date 20000508 Time 195557

Run Trigs_sent 732000 Events_seen 732000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 916 Date 20000508 Time 195558

Run Trigs_sent 732800 Events_seen 732800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 917 Date 20000508 Time 195559

Run Trigs_sent 733600 Events_seen 733600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 918 Date 20000508 Time 195600

Run Trigs_sent 734400 Events_seen 734400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 919 Date 20000508 Time 195601

Run Trigs_sent 735200 Events_seen 735200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180

ATLAS SCT Module Test Run 1 Burst 920 Date 20000508 Time 195602

Run Trigs_sent 736000 Events_seen 736000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185

ATLAS SCT Module Test Run 1 Burst 921 Date 20000508 Time 195603

Run Trigs_sent 736800 Events_seen 736800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190

ATLAS SCT Module Test Run 1 Burst 922 Date 20000508 Time 195604

Run Trigs_sent 737600 Events_seen 737600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195

ATLAS SCT Module Test Run 1 Burst 923 Date 20000508 Time 195605

Run Trigs_sent 738400 Events_seen 738400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200

ATLAS SCT Module Test Run 1 Burst 924 Date 20000508 Time 195606

Run Trigs_sent 739200 Events_seen 739200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205

ATLAS SCT Module Test Run 1 Burst 925 Date 20000508 Time 195607

Run Trigs_sent 740000 Events_seen 740000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210

ATLAS SCT Module Test Run 1 Burst 926 Date 20000508 Time 195608

Run Trigs_sent 740800 Events_seen 740800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215

ATLAS SCT Module Test Run 1 Burst 927 Date 20000508 Time 195609

Run Trigs_sent 741600 Events_seen 741600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220

ATLAS SCT Module Test Run 1 Burst 928 Date 20000508 Time 195610

Run Trigs_sent 742400 Events_seen 742400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225

ATLAS SCT Module Test Run 1 Burst 929 Date 20000508 Time 195611

Run Trigs_sent 743200 Events_seen 743200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230

ATLAS SCT Module Test Run 1 Burst 930 Date 20000508 Time 195612

Run Trigs_sent 744000 Events_seen 744000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235

ATLAS SCT Module Test Run 1 Burst 931 Date 20000508 Time 195613

Run Trigs_sent 744800 Events_seen 744800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240

ATLAS SCT Module Test Run 1 Burst 932 Date 20000508 Time 195614

Run Trigs_sent 745600 Events_seen 745600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245

ATLAS SCT Module Test Run 1 Burst 933 Date 20000508 Time 195615

Run Trigs_sent 746400 Events_seen 746400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250

ATLAS SCT Module Test Run 1 Burst 934 Date 20000508 Time 195616

Run Trigs_sent 747200 Events_seen 747200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255

ATLAS SCT Module Test Run 1 Burst 935 Date 20000508 Time 195617

Run Trigs_sent 748000 Events_seen 748000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260

ATLAS SCT Module Test Run 1 Burst 936 Date 20000508 Time 195618

Run Trigs_sent 748800 Events_seen 748800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

40 60 80 100 120 140 160 180

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265

ATLAS SCT Module Test Run 1 Burst 937 Date 20000508 Time 195619

Run Trigs_sent 749600 Events_seen 749600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270

ATLAS SCT Module Test Run 1 Burst 938 Date 20000508 Time 195620

Run Trigs_sent 750400 Events_seen 750400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 5 10 15 20 25 30

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275

ATLAS SCT Module Test Run 1 Burst 939 Date 20000508 Time 195621

Run Trigs_sent 751200 Events_seen 751200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280

ATLAS SCT Module Test Run 1 Burst 940 Date 20000508 Time 195622

Run Trigs_sent 752000 Events_seen 752000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285

ATLAS SCT Module Test Run 1 Burst 941 Date 20000508 Time 195623

Run Trigs_sent 752800 Events_seen 752800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290

ATLAS SCT Module Test Run 1 Burst 942 Date 20000508 Time 195624

Run Trigs_sent 753600 Events_seen 753600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295

ATLAS SCT Module Test Run 1 Burst 943 Date 20000508 Time 195625

Run Trigs_sent 754400 Events_seen 754400 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 943 Date 20000508 Time 195628

0

0

0

1

0

1

0

1

0

1

0

1

Run Trigs_sent 754400 Events_seen 754400 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 944 Date 20000508 Time 195629

Run Trigs_sent 755200 Events_seen 755200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 945 Date 20000508 Time 195630

Run Trigs_sent 756000 Events_seen 756000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 946 Date 20000508 Time 195631

Run Trigs_sent 756800 Events_seen 756800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 947 Date 20000508 Time 195632

Run Trigs_sent 757600 Events_seen 757600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 948 Date 20000508 Time 195633

Run Trigs_sent 758400 Events_seen 758400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 949 Date 20000508 Time 195634

Run Trigs_sent 759200 Events_seen 759200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 1 Burst Data

h_burst1

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 1 Burst Data

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 950 Date 20000508 Time 195635

Run Trigs_sent 760000 Events_seen 760000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 6 set 180 req 180

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0

100

200

300

400

500

600

700

800

Mustard Counters

h_merr

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 0 Burst Data

h_burst0

Channel Number

0 100 200 300 400 500 600 700

0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 951 Date 20000508 Time 195636

Run Trigs_sent 760800 Events_seen 760800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 7 set 185 req 185

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 952 Date 20000508 Time 195637

Run Trigs_sent 761600 Events_seen 761600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 8 set 190 req 190

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 953 Date 20000508 Time 195638

Run Trigs_sent 762400 Events_seen 762400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 9 set 195 req 195

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 954 Date 20000508 Time 195639

Run Trigs_sent 763200 Events_seen 763200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 10 set 200 req 200

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 955 Date 20000508 Time 195640

Run Trigs_sent 764000 Events_seen 764000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 11 set 205 req 205

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 956 Date 20000508 Time 195641

Run Trigs_sent 764800 Events_seen 764800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 12 set 210 req 210

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 957 Date 20000508 Time 195642

Run Trigs_sent 765600 Events_seen 765600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 13 set 215 req 215

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 958 Date 20000508 Time 195643

Run Trigs_sent 766400 Events_seen 766400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 14 set 220 req 220

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 959 Date 20000508 Time 195644

Run Trigs_sent 767200 Events_seen 767200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 15 set 225 req 225

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 960 Date 20000508 Time 195645

Run Trigs_sent 768000 Events_seen 768000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 16 set 230 req 230

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 961 Date 20000508 Time 195646

Run Trigs_sent 768800 Events_seen 768800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 17 set 235 req 235

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 962 Date 20000508 Time 195647

Run Trigs_sent 769600 Events_seen 769600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 18 set 240 req 240

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 963 Date 20000508 Time 195648

Run Trigs_sent 770400 Events_seen 770400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 19 set 245 req 245

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 964 Date 20000508 Time 195649

Run Trigs_sent 771200 Events_seen 771200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 20 set 250 req 250

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 965 Date 20000508 Time 195650

Run Trigs_sent 772000 Events_seen 772000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 21 set 255 req 255

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 966 Date 20000508 Time 195651

Run Trigs_sent 772800 Events_seen 772800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 22 set 260 req 260

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 967 Date 20000508 Time 195652

Run Trigs_sent 773600 Events_seen 773600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 23 set 265 req 265

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 968 Date 20000508 Time 195653

Run Trigs_sent 774400 Events_seen 774400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 24 set 270 req 270

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 969 Date 20000508 Time 195654

Run Trigs_sent 775200 Events_seen 775200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 25 set 275 req 275

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 970 Date 20000508 Time 195655

Run Trigs_sent 776000 Events_seen 776000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 26 set 280 req 280

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 971 Date 20000508 Time 195656

Run Trigs_sent 776800 Events_seen 776800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 27 set 285 req 285

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 972 Date 20000508 Time 195657

Run Trigs_sent 777600 Events_seen 777600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 28 set 290 req 290

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 973 Date 20000508 Time 195658

Run Trigs_sent 778400 Events_seen 778400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 29 set 295 req 295

0

0 0

20

40

60

80

100

120

140

160

180

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 974 Date 20000508 Time 195659

Run Trigs_sent 779200 Events_seen 779200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 30 set 300 req 300

0

0 0

10

20

30

40

50

60

70

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 975 Date 20000508 Time 195700

Run Trigs_sent 780000 Events_seen 780000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 31 set 305 req 305

0

0

-1

-0.5

0

0.5

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 976 Date 20000508 Time 195701

Run Trigs_sent 780800 Events_seen 780800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 32 set 310 req 310

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 977 Date 20000508 Time 195702

Run Trigs_sent 781600 Events_seen 781600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 33 set 315 req 315

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 978 Date 20000508 Time 195703

Run Trigs_sent 782400 Events_seen 782400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 34 set 320 req 320

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 979 Date 20000508 Time 195704

Run Trigs_sent 783200 Events_seen 783200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 35 set 325 req 325

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 980 Date 20000508 Time 195705

Run Trigs_sent 784000 Events_seen 784000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 36 set 330 req 330

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 981 Date 20000508 Time 195707

Run Trigs_sent 784800 Events_seen 784800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 37 set 335 req 335

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 982 Date 20000508 Time 195708

Run Trigs_sent 785600 Events_seen 785600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 38 set 340 req 340

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 983 Date 20000508 Time 195709

Run Trigs_sent 786400 Events_seen 786400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 39 set 345 req 345

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 984 Date 20000508 Time 195710

Run Trigs_sent 787200 Events_seen 787200 Stream_errors 0 Timeouts 0 Other_errors 0

0

0

0

1

0

1

0

1

0

1

0

1