ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 24 Charge 3.00fC) - (Run 1 Scan 23 Charge 2.00fC)

Channel Number

100 200 300 400 500 600 700

Gain at 2.50fC (mV/fC)

42

44

46

48

50

52 Gain (mV/fC)

Channel Number

100 200 300 400 500 600 700

Offset at 2.50fC (mV)

80

90

100

110

120

130 Offset (mV)

Channel Number

100 200 300 400 500 600 700

Input Noise at 2.50fC (ENC)

500

550

600

650

700

750 Noise (ENC)

Gain at 2.50fC (mV/fC)

40 45 50 55 60 65 70 75 80 n(Gain)

0 20 40 60 80 100 120 140 160 180 200 220 240 Gain, all channels

Offset at 2.50fC (mV)

0 20 40 60 80 100 120 140 n(Offset)

0

20

40

60

80

100

Offset, all channels

Input Noise at 2.50fC (ENC)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 n(Noise)

0

50

100

150

200

250

300

350

400 Noise, all channels

ATLAS SCT Quick evaluation of Gain/Offset/Noise module 0 link 1 (Run 1 Scan 24 Charge 3.00fC) - (Run 1 Scan 23 Charge 2.00fC)

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0 2 4 6 8 10 12 14 16 18 20 22 Gain, chip 0

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14 Gain, chip 1

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14

16 Gain, chip 2

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14

16

18 Gain, chip 3

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

5

10

15

20

25 Gain, chip 4

Gain(mV/fC)

42 44 46 48 50 52

N(Gain)

0

2

4

6

8

10

12

14

16

18

20 Gain, chip 5

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2

4

6

8

10

12

14

16

18 20

22 Offset, chip 0

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

Offset, chip 1

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2

4

6

8

10

12

14

16

18 20

22 Offset, chip 2

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 3

Offset(mV)

80 90 100 110 120 130

N(Mean)

0

2

4

6

8

10

12

14

16

18 Offset, chip 4

Offset(mV)

80 90 100 110 120 130

N(Mean)

0 2 4 6 8 10 12 14 16 18 20 22 Offset, chip 5

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

Input Noise, chip 0

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 1

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18 Input Noise, chip 2

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16

18

20 Input Noise, chip 3

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 4

Noise(ENC)

500 550 600 650 700 750

N(Mean)

0

2

4

6

8

10

12

14

16 Input Noise, chip 5

ATLAS SCT Module Test Run 1 Burst 984 Date 20000508 Time 195824 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 787200 Events_seen 787200 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0 100 200 300 400 500 600 700 800 Mustard Counters h_merr Nent = 20

Channel Number

0 100 200 300 400 500 600 700

Hits

0 20 40 60 80 100 120 140 160 180 200 Module 0 Stream 0 Burst Data h_burst0 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 0 Stream 1 Burst Data h_burst1 Nent = 768

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1 Module 2 Stream 1 Burst Data

Run Trigs_sent 787200 Events_seen 787200 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 985 Date 20000508 Time 195825 Burst Trigs_sent 200 Events_seen 200 Stream_errors 0 Timeouts 0 Other_errors 0 Run Trigs_sent 788000 Events_seen 788000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 0 set 100 req 100

ATLAS SCT Module Test Run 1 Burst 986 Date 20000508 Time 195826

Run Trigs_sent 788800 Events_seen 788800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 1 set 105 req 105

ATLAS SCT Module Test Run 1 Burst 987 Date 20000508 Time 195827

Run Trigs_sent 789600 Events_seen 789600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 2 set 110 req 110

ATLAS SCT Module Test Run 1 Burst 988 Date 20000508 Time 195828

Run Trigs_sent 790400 Events_seen 790400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 3 set 115 req 115

ATLAS SCT Module Test Run 1 Burst 989 Date 20000508 Time 195829

Run Trigs_sent 791200 Events_seen 791200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 4 set 120 req 120

ATLAS SCT Module Test Run 1 Burst 990 Date 20000508 Time 195830

Run Trigs_sent 792000 Events_seen 792000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 5 set 125 req 125

ATLAS SCT Module Test Run 1 Burst 991 Date 20000508 Time 195831

Run Trigs_sent 792800 Events_seen 792800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 6 set 130 req 130

ATLAS SCT Module Test Run 1 Burst 992 Date 20000508 Time 195832

Run Trigs_sent 793600 Events_seen 793600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 7 set 135 req 135

ATLAS SCT Module Test Run 1 Burst 993 Date 20000508 Time 195833

Run Trigs_sent 794400 Events_seen 794400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 8 set 140 req 140

ATLAS SCT Module Test Run 1 Burst 994 Date 20000508 Time 195834

Run Trigs_sent 795200 Events_seen 795200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 9 set 145 req 145

ATLAS SCT Module Test Run 1 Burst 995 Date 20000508 Time 195835

Run Trigs_sent 796000 Events_seen 796000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 10 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 996 Date 20000508 Time 195836

Run Trigs_sent 796800 Events_seen 796800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 11 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 997 Date 20000508 Time 195837

Run Trigs_sent 797600 Events_seen 797600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 12 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 998 Date 20000508 Time 195838

Run Trigs_sent 798400 Events_seen 798400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 13 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 999 Date 20000508 Time 195839

Run Trigs_sent 799200 Events_seen 799200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 14 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 1000 Date 20000508 Time 195840

Run Trigs_sent 800000 Events_seen 800000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 15 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 1001 Date 20000508 Time 195841

Run Trigs_sent 800800 Events_seen 800800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 16 set 180 req 180

ATLAS SCT Module Test Run 1 Burst 1002 Date 20000508 Time 195842

Run Trigs_sent 801600 Events_seen 801600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 17 set 185 req 185

ATLAS SCT Module Test Run 1 Burst 1003 Date 20000508 Time 195843

Run Trigs_sent 802400 Events_seen 802400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 18 set 190 req 190

ATLAS SCT Module Test Run 1 Burst 1004 Date 20000508 Time 195844

Run Trigs_sent 803200 Events_seen 803200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 19 set 195 req 195

ATLAS SCT Module Test Run 1 Burst 1005 Date 20000508 Time 195845

Run Trigs_sent 804000 Events_seen 804000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 20 set 200 req 200

ATLAS SCT Module Test Run 1 Burst 1006 Date 20000508 Time 195846

Run Trigs_sent 804800 Events_seen 804800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 21 set 205 req 205

ATLAS SCT Module Test Run 1 Burst 1007 Date 20000508 Time 195847

Run Trigs_sent 805600 Events_seen 805600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 22 set 210 req 210

ATLAS SCT Module Test Run 1 Burst 1008 Date 20000508 Time 195848

Run Trigs_sent 806400 Events_seen 806400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 23 set 215 req 215

ATLAS SCT Module Test Run 1 Burst 1009 Date 20000508 Time 195849

Run Trigs_sent 807200 Events_seen 807200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 24 set 220 req 220

ATLAS SCT Module Test Run 1 Burst 1010 Date 20000508 Time 195850

Run Trigs_sent 808000 Events_seen 808000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 25 set 225 req 225

ATLAS SCT Module Test Run 1 Burst 1011 Date 20000508 Time 195851

Run Trigs_sent 808800 Events_seen 808800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 26 set 230 req 230

ATLAS SCT Module Test Run 1 Burst 1012 Date 20000508 Time 195852

Run Trigs_sent 809600 Events_seen 809600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 27 set 235 req 235

ATLAS SCT Module Test Run 1 Burst 1013 Date 20000508 Time 195853

Run Trigs_sent 810400 Events_seen 810400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 28 set 240 req 240

ATLAS SCT Module Test Run 1 Burst 1014 Date 20000508 Time 195854

Run Trigs_sent 811200 Events_seen 811200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 29 set 245 req 245

ATLAS SCT Module Test Run 1 Burst 1015 Date 20000508 Time 195855

Run Trigs_sent 812000 Events_seen 812000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 30 set 250 req 250

ATLAS SCT Module Test Run 1 Burst 1016 Date 20000508 Time 195856

Run Trigs_sent 812800 Events_seen 812800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 31 set 255 req 255

ATLAS SCT Module Test Run 1 Burst 1017 Date 20000508 Time 195857

Run Trigs_sent 813600 Events_seen 813600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 32 set 260 req 260

ATLAS SCT Module Test Run 1 Burst 1018 Date 20000508 Time 195858

Run Trigs_sent 814400 Events_seen 814400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

60 80 100 120 140 160 180 200

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 33 set 265 req 265

ATLAS SCT Module Test Run 1 Burst 1019 Date 20000508 Time 195859

Run Trigs_sent 815200 Events_seen 815200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 20 40 60 80 100 120 140

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 34 set 270 req 270

ATLAS SCT Module Test Run 1 Burst 1020 Date 20000508 Time 195900

Run Trigs_sent 816000 Events_seen 816000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0 5 10 15 20 25 30

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 35 set 275 req 275

ATLAS SCT Module Test Run 1 Burst 1021 Date 20000508 Time 195901

Run Trigs_sent 816800 Events_seen 816800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0.5

1

1.5

2

2.5

3

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 36 set 280 req 280

ATLAS SCT Module Test Run 1 Burst 1022 Date 20000508 Time 195902

Run Trigs_sent 817600 Events_seen 817600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 37 set 285 req 285

ATLAS SCT Module Test Run 1 Burst 1023 Date 20000508 Time 195903

Run Trigs_sent 818400 Events_seen 818400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 38 set 290 req 290

ATLAS SCT Module Test Run 1 Burst 1024 Date 20000508 Time 195904

Run Trigs_sent 819200 Events_seen 819200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 100.0 to 300.0 steps 5.0 at cnt 39 set 295 req 295

ATLAS SCT Module Test Run 1 Burst 1025 Date 20000508 Time 195905

Run Trigs_sent 820000 Events_seen 820000 Stream_errors 0 Timeouts 0 Other_errors 0_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1025 Date 20000508 Time 195908

0

0

0

1

0

1

0

1

0

1

0

1

Run Trigs_sent 820000 Events_seen 820000 Stream_errors 0 Timeouts 0 Other_errors 0

ATLAS SCT Module Test Run 1 Burst 1026 Date 20000508 Time 195909

Run Trigs_sent 820800 Events_seen 820800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 0 set 150 req 150

ATLAS SCT Module Test Run 1 Burst 1027 Date 20000508 Time 195910

Run Trigs_sent 821600 Events_seen 821600 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 1 set 155 req 155

ATLAS SCT Module Test Run 1 Burst 1028 Date 20000508 Time 195911

Run Trigs_sent 822400 Events_seen 822400 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 2 set 160 req 160

ATLAS SCT Module Test Run 1 Burst 1029 Date 20000508 Time 195912

Run Trigs_sent 823200 Events_seen 823200 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 3 set 165 req 165

ATLAS SCT Module Test Run 1 Burst 1030 Date 20000508 Time 195913

Run Trigs_sent 824000 Events_seen 824000 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0 0

0

1

0

1

0

1

0

1

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 4 set 170 req 170

ATLAS SCT Module Test Run 1 Burst 1031 Date 20000508 Time 195914

Run Trigs_sent 824800 Events_seen 824800 Stream_errors 0 Timeouts 0 Other_errors 0 Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175_{0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5} 0

0

100

120

140

160

180

200

Module 0 Stream 0 Burst Data

h_burst0

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

100

120

140

160

180

200

Module 0 Stream 1 Burst Data

h_burst1

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 1 Stream 1 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 0 Burst Data

Channel Number

0 100 200 300 400 500 600 700

Hits

-1

-0.5

0

0.5

1

Module 2 Stream 1 Burst Data

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 5 set 175 req 175

ATLAS SCT Module Test Run 1 Burst 1032 Date 20000508 Time 195915

Run Trigs_sent 825600 Events_seen 825600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 6 set 180 req 180

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0

100

200

300

400

500

600

700

800

Mustard Counters

h_merr

Channel Number

0 100 200 300 400 500 600 700

Hits

0

20

40

60

80

0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1033 Date 20000508 Time 195916

Run Trigs_sent 826400 Events_seen 826400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 7 set 185 req 185

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1034 Date 20000508 Time 195917

Run Trigs_sent 827200 Events_seen 827200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 8 set 190 req 190

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1035 Date 20000508 Time 195918

Run Trigs_sent 828000 Events_seen 828000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 9 set 195 req 195

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1036 Date 20000508 Time 195919

Run Trigs_sent 828800 Events_seen 828800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 10 set 200 req 200

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1037 Date 20000508 Time 195920

Run Trigs_sent 829600 Events_seen 829600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 11 set 205 req 205

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1038 Date 20000508 Time 195921

Run Trigs_sent 830400 Events_seen 830400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 12 set 210 req 210

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1039 Date 20000508 Time 195922

Run Trigs_sent 831200 Events_seen 831200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 13 set 215 req 215

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1040 Date 20000508 Time 195923

Run Trigs_sent 832000 Events_seen 832000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 14 set 220 req 220

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1041 Date 20000508 Time 195924

Run Trigs_sent 832800 Events_seen 832800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 15 set 225 req 225

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1042 Date 20000508 Time 195925

Run Trigs_sent 833600 Events_seen 833600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 16 set 230 req 230

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1043 Date 20000508 Time 195926

Run Trigs_sent 834400 Events_seen 834400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 17 set 235 req 235

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1044 Date 20000508 Time 195927

Run Trigs_sent 835200 Events_seen 835200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 18 set 240 req 240

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1045 Date 20000508 Time 195928

Run Trigs_sent 836000 Events_seen 836000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 19 set 245 req 245

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1046 Date 20000508 Time 195929

Run Trigs_sent 836800 Events_seen 836800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 20 set 250 req 250

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1047 Date 20000508 Time 195930

Run Trigs_sent 837600 Events_seen 837600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 21 set 255 req 255

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1048 Date 20000508 Time 195931

Run Trigs_sent 838400 Events_seen 838400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 22 set 260 req 260

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1049 Date 20000508 Time 195932

Run Trigs_sent 839200 Events_seen 839200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 23 set 265 req 265

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1050 Date 20000508 Time 195933

Run Trigs_sent 840000 Events_seen 840000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 24 set 270 req 270

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1051 Date 20000508 Time 195934

Run Trigs_sent 840800 Events_seen 840800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 25 set 275 req 275

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1052 Date 20000508 Time 195935

Run Trigs_sent 841600 Events_seen 841600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 26 set 280 req 280

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1053 Date 20000508 Time 195936

Run Trigs_sent 842400 Events_seen 842400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 27 set 285 req 285

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1054 Date 20000508 Time 195937

Run Trigs_sent 843200 Events_seen 843200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 28 set 290 req 290

0

0 0

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1055 Date 20000508 Time 195938

Run Trigs_sent 844000 Events_seen 844000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 29 set 295 req 295

0

0 0

20

40

60

80

100

120

140

160

180

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1056 Date 20000508 Time 195939

Run Trigs_sent 844800 Events_seen 844800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 30 set 300 req 300

0

0 0

10

20

30

40

50

60

70

80

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1057 Date 20000508 Time 195940

Run Trigs_sent 845600 Events_seen 845600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 31 set 305 req 305

0

0

-1

-0.5

0

0.5

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1058 Date 20000508 Time 195941

Run Trigs_sent 846400 Events_seen 846400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 32 set 310 req 310

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1059 Date 20000508 Time 195942

Run Trigs_sent 847200 Events_seen 847200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 33 set 315 req 315

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1060 Date 20000508 Time 195943

Run Trigs_sent 848000 Events_seen 848000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 34 set 320 req 320

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1061 Date 20000508 Time 195944

Run Trigs_sent 848800 Events_seen 848800 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 35 set 325 req 325

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1062 Date 20000508 Time 195945

Run Trigs_sent 849600 Events_seen 849600 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 36 set 330 req 330

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1063 Date 20000508 Time 195947

Run Trigs_sent 850400 Events_seen 850400 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 37 set 335 req 335

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1064 Date 20000508 Time 195948

Run Trigs_sent 851200 Events_seen 851200 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 38 set 340 req 340

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1065 Date 20000508 Time 195949

Run Trigs_sent 852000 Events_seen 852000 Stream_errors 0 Timeouts 0 Other_errors 0

Scan of THRESHOLD (mV) from 150.0 to 350.0 steps 5.0 at cnt 39 set 345 req 345

0

0

0

1

0

1

0

1

0

1

0

1

ATLAS SCT Module Test Run 1 Burst 1066 Date 20000508 Time 195950

Run Trigs_sent 852800 Events_seen 852800 Stream_errors 0 Timeouts 0 Other_errors 0

0

0

0

1

0

1

0

1

0

1

0

1