〉 zδ〈 0 0.2 0.4 0.6 0.8 1

Events

0 100 200 300 400 500 600

0

600_{< 6 GeV}

γT,

4 < E

〉 zδ〈 0 0.2 0.4 0.6 0.8 1

Events

0 50 100 150 200 250

0

250^{< 8 GeV}

γT,

6 < E

〉 zδ〈 0 0.2 0.4 0.6 0.8 1

Events

0 20 40 60 80 100 120 140

0

140_{< 10 GeV}

γT,

8 < E

〉 zδ〈 0 0.2 0.4 0.6 0.8 1

Events

0 20 40 60 80 100 120 140

0

-1 ZEUS (prel.) 332 pb LL MC QQ MC LL+QQ+Hadr.MC

< 15 GeV

γT,

10 < E

ZEUS