Spect/mu__energy:h32

Entries 4340 Mean 0.9998 RMS 0.009823 / ndf

2χ 335.2 / 38 Prob 0 Constant 27.7± 1221 Mean 0.0001 ± 0.9997 Sigma 0.000082 ± 0.005102

Spectrometer_fCandidates_fMomentum[i]/fKineParts_fInitialEnergy[i]

0.9 0.92 0.94 0.96 0.98 1 1.02 1.04 1.06 1.08 1.1 0 200 400 600 800 1000

1200

± ±

Spect/mu_energy:h32

LKr_cluster_energy:h32a

Entries 3496 Mean 0.691 RMS 0.3299

Mu:_LKr_cluster_energy (GeV)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 200 400 600 800 1000

1200

LKr_cluster_energy:h32a