h6a Entries 7069 Mean 0.00963 RMS 0.009907

X_cluster_LKr - X_projected_from_spectrometer (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0

100

200

300

400

500 (xc-xp)_spect_proj_to_241.3m h5

Entries 3373 Mean 0.999 RMS 0.01035

Momentum_meas_Spectrometer / True_momentum

0.9 0.92 0.94 0.96 0.98 1 1.02 1.04 1.06 1.08 1.1 0

200

400

600

800

1000 h5 (mom_meas/mom_true)_Spectrometer_lepton(Meas/true)

h6b Entries 7069 Mean -0.0003864 RMS 0.009742

Y_cluster_Lkr - Y_projected_from_spectrometer (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0

100

200

300

400

500

600 (yc-yp)_spect_proj_to_241.3m h6

Entries 2303 Mean 1.617 RMS 0.5268

Energy deposited by muon in LKr (GeV)

0 0.5 1 1.5 2 2.5 0

0.2

0.4

0.6

0.8

1 h6 lepton_energy_deposit_LkR