e+ Spectrometer Momentum (GeV)

0 10 20 30 40 50 60 70 80 90 100 e+ Acceptance: Events per bin, measured/true

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Acc_Spect_energy(GeV)