True_Spect_energy(GeV)

Entries 4926 Mean 19.84 RMS 14.06

e+ Spectrometer Momentum (GeV)

0 10 20 30 40 50 60 70 80 90 100 0 100 200 300 400 500 600 700 800 True_Spect_energy(GeV)