(xhit+150)/350

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 yhit/350

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 h54 Entries 78504 Mean x 0.05802 Mean y 0.002278 RMS x 0.4137 RMS y 0.3962

RICH (xhit+150.)/350. vs yhit/350. h55a

Entries 78504 Mean 1.122 RMS 8.471

RICH: X of hit - expected X (mm)

-50 -40 -30 -20 -10 0 10 20 30 40 50 0

2000

4000

6000

8000

10000

12000

h55a

RICH hit_x_meas -x_expected (mm)

h55 Entries 78504 Mean 0.2642 RMS 10.87

RICH: radius of hit - expected radius (mm)

-50 -40 -30 -20 -10 0 10 20 30 40 50 0 1000

2000

3000

4000

5000

6000

7000

8000

RICH hit_radius_meas - radius_expected (mm) h55b

Entries 78504 Mean -0.05405 RMS 8.409

RICH: Y of hit - expected Y (mm)

-50 -40 -30 -20 -10 0 10 20 30 40 50 0

2000

4000

6000

8000

10000

12000

h55b

RICH hit_y_meas -y_expected (mm)