mu Z-start true(m)

100 110 120 130 140 150 160 170 180 190 200 mu Acceptance: measured/true dp 5%

0 0.2 0.4 0.6 0.8 1 Acc_Spect_Z-start dp 5%

Meas_Spect_Z-start dp 5%

Entries 4209 Mean 159 RMS 17.03

mu Z-start true (m) meas/true 5%

100 110 120 130 140 150 160 170 180 190 200 0 100 200 300 400 500 600 700 800 Meas_Spect_Z-start dp 5%

True_Z-start Entries 4929 Mean 160.3 RMS 16.99

mu Spectrometer Z-start(m)

100 110 120 130 140 150 160 170 180 190 200 0 200 400 600 800 1000

1200 True_Z-start

True_Z-start