fKineParts_fEndPos_fP_fZ[i]/1000. GAMMA z(m)

235 236 237 238 239 240 241 242 243

Radius(m)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 Z-R_end_gam Entries 246731 Mean x 240.6 Mean y 0.7115 RMS x 1.299 RMS y 0.3633

Z-R_end_gam