fKineParts_fEndPos_fP_fZ[i]/1000. GAMMA z(m)

100 120 140 160 180 200 220 240 260 280

Radius(m)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 Z-R_end_gam Entries 246731 Mean x 228.7 Mean y 0.8048 RMS x 23.74 RMS y 0.3817

Z-R_end_gam