Spect/e_energy:h32

Entries 3399 Mean 0.9992 RMS 0.008306 / ndf

2χ 250.8 / 44 Prob 9.466e-31 Constant 12.7±

488.6 Mean 0.0001 ± 0.9995 Sigma 0.000091 ± 0.004916

Spectrometer_fCandidates_fMomentum[i]/fKineParts_fInitialEnergy[i]

0.95 0.96 0.97 0.98 0.99 1 1.01 1.02 1.03 1.04 1.05 0

100

200

300

400

500

± ±

Spect/e_energy:h32