Spect/e_energy

Entries 676 Mean 0.999 RMS 0.007546 / ndf

2χ 66.27 / 30 Prob 0.0001507 Constant 6.8±

104.2 Mean 0.0002 ± 0.9993 Sigma 0.000223 ± 0.004471

Spectrometer_fCandidates_fMomentum[i]/fKineParts_fInitialEnergy[i]

0.95 0.96 0.97 0.98 0.99 1 1.01 1.02 1.03 1.04 1.05 0

20

40

60

80

100

120

± ±

Spect/e_energy