Spect/mu_energy:h32

Entries 4135 Mean 0.9998 RMS 0.007595 / ndf

2χ 298.7 / 44 Prob 1.423e-39 Constant 14.4±

611.3 Mean 0.0± 1 Sigma 0.00008 ± 0.00487

Spectrometer_fCandidates_fMomentum[i]/fKineParts_fInitialEnergy[i]

0.95 0.96 0.97 0.98 0.99 1 1.01 1.02 1.03 1.04 1.05 0

100

200

300

400

500

600

700

±

Spect/mu_energy:h32