x_muon-x_cluster_LKr-h33a Entries 2422 Mean -0.01251 RMS 0.009757 / ndf

2χ 139.9 / 30 Prob 3.929e-16 Constant 19.0±

650.5 Mean 0.00011 ± -0.01205 Sigma 0.000105 ± 0.005316

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0

100

200

300

400

500

600

± ±

x_muon-x_cluster_LKr-h33a