x_muon-x_cluster_LKr-h33 Entries 2422 Mean 0.0001305 RMS 0.01404 / ndf

2χ 279 / 36 Prob 2.348e-39 Constant 16.0±

527.5 Mean 0.000166 ± 0.001143 Sigma 0.000133 ± 0.006355

X muon - X cluster (m)

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0

100

200

300

400

500

± ±

x_muon-x_cluster_LKr-h33