x_true-x_cluster_LKr Entries 8158 Mean -0.009139 RMS 0.005864

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0 200 400 600 800 1000

1200

1400

1600

1800

2000

x_true-x_cluster_LKr