x_true-x_cluster_LKr

Entries 2373 Mean -0.009512 RMS 0.00189 / ndf

2χ 58.27 / 18 Prob 3.876e-06 Constant 15.8±

557.7 Mean 0.000035 ± -0.009536 Sigma 0.000032 ± 0.001653

X true - X measured (m)

-0.025 -0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0.025 0

100

200

300

400

500

600

± ±

x_true-x_cluster_LKr