y_true-y_cluster_LKr

Entries 2373 Mean 0.0004055 RMS 0.001679 / ndf

2χ 75.91 / 19 Prob 9.322e-09 Constant 19.4±

670.5 Mean 0.0000285 ± 0.0004247 Sigma 0.000027 ± 0.001364

Y true - Y measured (m)

-0.025 -0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0.025 0

100 200 300 400 500 600

700 800 y_true-y_cluster_LKr

± ±

y_true-y_cluster_LKr