cluster_energy/true_energy Entries 2373 Mean 1.004 RMS 0.02222 / ndf

2χ 236 / 28 Prob 8.72e-35 Constant 16.5±

513.6 Mean 0.000 ± 1.008 Sigma 0.00031 ± 0.01304

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

100

200

300

400

500

600

± ±

cluster_energy/true_energy