h44b

Entries 2292 Mean 241.3 RMS 0.09236 / ndf

2χ 92.04 / 17 Prob 2.59e-12 Constant 14.2±

522.7 Mean 0.0±

241.3 Sigma 0.00140 ± 0.08353

Z(true) end of positron in LKr (m)

240.4 240.6 240.8 241 241.2 241.4 241.6 241.8 242 242.2 242.4 0

100

200

300

400

500

±

LKr cluster matched to lepton, Z(true)-end_of_lepton (m)