esum/egam

Entries 5000 Mean 1.009 RMS 0.0261 Underflow 4277 Overflow 1 / ndf

2χ 60.26 / 42 Prob 0.03355 Constant 4.04±

78.29 Mean 0.001±

1.012 Sigma 0.00046 ± 0.01349

energy LKr/Energy initial gammas restricted in radius

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0 10 20 30 40 50 60 70 80 90

±

esum/egam