esum/egam Entries 5000 Mean 0.9794 RMS 0.05892 / ndf

2χ 837.4 / 70 Constant 7.5±

249.2 Mean 0.000±

1.009 Sigma 0.00030 ± 0.01426

energy LKr/Energy gammas

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 0

50

100

150

200

250

±

esum/egam