Spect/muon_energy

Entries 3817 Mean 0.9995 RMS 0.006617 / ndf

2χ 181.6 / 42 Prob 2.841e-19 Constant 14.6±

624.8 Mean 0.0001 ± 0.9996 Sigma 0.000073 ± 0.004501

0.95 0.96 0.97 0.98 0.99 1 1.01 1.02 1.03 1.04 1.05 0

100

200

300

400

500

600

700

± ±

Spect/muon_energy