x_muon-x_cluster_LKr

Entries 2555 Mean 0.001119 RMS 0.01016 / ndf

2χ 245 / 45 Prob 2.539e-29 Constant 8.1±

263.4 Mean 0.000163 ± 0.000893 Sigma 0.000133 ± 0.006169

x_muon - x_cluster (m)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0

50

100

150

200

250

± ±

x_muon-x_cluster_LKr