(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

5

10

15

20

25

30

HepgL_0_2_11 Entries 1528 Mean 1.328 RMS 0.8717 H120:Rejected:MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 10

20

30

40

50

60

HepgL_1_2_11 Entries 2921 Mean 1.284 RMS 0.8615 H120:Rejected:E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 5 10 15

20 25

30 35

HepgL_2_2_11 Entries 1571 Mean 1.283 RMS 0.8692 H120:Rejected:E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 2 4 6 8 10 12 14 16

HepgL_3_2_11 Entries 621 Mean 1.213 RMS 0.8334

H120:Rejected:Tau_MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3

2

4

6

8

10

12

14

HepgL_4_2_11 Entries 657 Mean 1.283 RMS 0.8541

H120:Rejected:Tau_E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 2 4 6 8 10 12 14 16

HepgL_5_2_11 Entries 592 Mean 1.273 RMS 0.8732

H120:Rejected:Tau_MU_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

2 4

6

8 10

12

14

HepgL_6_2_11 Entries 636 Mean 1.306 RMS 0.8498 H120:Rejected:Tau_E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_9_2_11 Entries 51 Mean 1.287 RMS 0.8433

H120:Rejected:Tau_E_Tau_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_7_2_11 Entries 60 Mean 1.279 RMS 0.8756

H120:Rejected:Tau_MU_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.5 1 1.5 2 2.5 3 3.5 4

HepgL_8_2_11 Entries 118 Mean 1.35 RMS 0.8842

H120:Rejected:Tau_E_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_9_2_11 Entries 51 Mean 1.287 RMS 0.8433

H120:Rejected:Tau_E_Tau_E