HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_0_3_7

Entries 47 Mean x 0.07741 Mean y 0.003488 RMS x 1.696 RMS y 0.5768

H120:SelectedFake:MU_MU

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_1_3_7

Entries 280 Mean x 0.0698 Mean y 0.01826 RMS x 1.912 RMS y 0.6488

H120:SelectedFake:E_MU

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_2_3_7

Entries 168 Mean x 0.03224 Mean y -0.01823 RMS x 1.821 RMS y 0.8158

H120:SelectedFake:E_E

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_3_3_7

Entries 2 Mean x -0.002077 Mean y 0.1536 RMS x 2.937 RMS y 0.5996

H120:SelectedFake:Tau_MU_MU

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_4_3_7

Entries 20 Mean x -0.6242 Mean y 0.05444 RMS x 1.661 RMS y 0.6791

H120:SelectedFake:Tau_E_MU

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_5_3_7

Entries 16 Mean x 0.6488 Mean y 0.07179 RMS x 1.565 RMS y 0.6918

H120:SelectedFake:Tau_MU_E

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_6_3_7

Entries 26 Mean x 0.4258 Mean y 0.007608 RMS x 1.943 RMS y 0.7173

H120:SelectedFake:Tau_E_E

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_9_3_7 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0

H120:SelectedFake:Tau_E_Tau_E

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_7_3_7

Entries 1 Mean x 2.973 Mean y 0.3438 RMS x 2.794e-08 RMS y 2.281e-09

H120:SelectedFake:Tau_MU_Tau_MU

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_8_3_7 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0

H120:SelectedFake:Tau_E_Tau_MU

HepgL:Phi2

-3 -2 -1 0 1 2 3

HepgL:DetEta2

-3

-2

-1

0

1

2

3 HepgL_9_3_7 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0

H120:SelectedFake:Tau_E_Tau_E