(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.5 1 1.5 2 2.5 3 3.5 4

HepgL_0_3_11 Entries 47 Mean 1.007 RMS 0.7041

H120:SelectedFake:MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

2

4

6

8

10

HepgL_1_3_11 Entries 280 Mean 1.194 RMS 0.7756

H120:SelectedFake:E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

1 2

3

4 5

6

7

HepgL_2_3_11 Entries 168 Mean 1.4 RMS 0.8839 H120:SelectedFake:E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_3_3_11 Entries 2 Mean 1.398 RMS 0.7275

H120:SelectedFake:Tau_MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

HepgL_4_3_11 Entries 20 Mean 1.171 RMS 0.7872

H120:SelectedFake:Tau_E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

HepgL_5_3_11 Entries 16 Mean 1.175 RMS 0.7933

H120:SelectedFake:Tau_MU_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_6_3_11 Entries 26 Mean 1.093 RMS 0.6484

H120:SelectedFake:Tau_E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_9_3_11

Entries 0 Mean 0 RMS 0

H120:SelectedFake:Tau_E_Tau_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_7_3_11 Entries 1 Mean 1.451 RMS 8.933e-09

H120:SelectedFake:Tau_MU_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_8_3_11

Entries 0 Mean 0 RMS 0

H120:SelectedFake:Tau_E_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_9_3_11

Entries 0 Mean 0 RMS 0

H120:SelectedFake:Tau_E_Tau_E