(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 2 4 6 8 10 12 14

HepgL_0_1_11 Entries 395 Mean 1.111 RMS 0.7818 H120:Selected:MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 2 4 6 8 10 12 14 16 18

HepgL_1_1_11 Entries 752 Mean 1.19 RMS 0.8158 H120:Selected:E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

2

4

6

8

10

HepgL_2_1_11 Entries 348 Mean 1.263 RMS 0.843 H120:Selected:E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_3_1_11 Entries 37 Mean 1.173 RMS 0.8163

H120:Selected:Tau_MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

HepgL_4_1_11 Entries 46 Mean 1.252 RMS 0.863

H120:Selected:Tau_E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

HepgL_5_1_11 Entries 34 Mean 1.574 RMS 0.8393

H120:Selected:Tau_MU_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_6_1_11 Entries 42 Mean 1.387 RMS 0.9388 H120:Selected:Tau_E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_9_1_11 Entries 1 Mean 2.841 RMS 2.564e-08

H120:Selected:Tau_E_Tau_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_7_1_11

Entries 0 Mean 0 RMS 0

H120:Selected:Tau_MU_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_8_1_11 Entries 1 Mean 0.2406 RMS 9.547e-10

H120:Selected:Tau_E_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_9_1_11 Entries 1 Mean 2.841 RMS 2.564e-08

H120:Selected:Tau_E_Tau_E