(met, dilepton) ΦΔ Uncorrected

-3 -2 -1 0 1 2 3 4 5 6 0 20 40 60 80 100 120 140 160

MetDildPhi_0 Entries 2889 Mean 0.04258 RMS 2.346

H120

(met, dilepton) ΦΔ MuCorrected

-3 -2 -1 0 1 2 3 4 5 6 0

50

100

150

200

250

300

MetDildPhi_1 Entries 2889 Mean 0.02004 RMS 2.734

(met, dil) ΦΔ JetMuonCorrected

-3 -2 -1 0 1 2 3 4 5 6 0

50

100

150

200

250

300

MetDildPhi_2 Entries 2889 Mean 0.05357 RMS 2.69

(met, dilepton) ΦΔ JetMuPhxCor

-3 -2 -1 0 1 2 3 4 5 6 0

50

100

150

200

250

300

MetDildPhi_3 Entries 2889 Mean 0.06248 RMS 2.691

(met, dilepton) ΦΔ JetMuPhxCenCor

-3 -2 -1 0 1 2 3 4 5 6 0

50

100

150

200

250

300

MetDildPhi_4 Entries 2889 Mean 0.07131 RMS 2.69