(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

1

2

3

4

5

6

HepgL_0_3_11 Entries 77 Mean 0.866 RMS 0.7237 SelectedFake:MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

2

4

6

8

10

12

HepgL_1_3_11 Entries 351 Mean 0.9957 RMS 0.75 SelectedFake:E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 1 2 3 4 5 6 7 8 9

HepgL_2_3_11 Entries 239 Mean 1.118 RMS 0.7661 SelectedFake:E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_3_3_11 Entries 7 Mean 1.099 RMS 0.7497

SelectedFake:Tau_MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

HepgL_4_3_11 Entries 23 Mean 0.9335 RMS 0.6179 SelectedFake:Tau_E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_5_3_11 Entries 37 Mean 0.8102 RMS 0.4602 SelectedFake:Tau_MU_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5

3

HepgL_6_3_11 Entries 45 Mean 0.9256 RMS 0.6405 SelectedFake:Tau_E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_9_3_11 Entries 1 Mean 1.477 RMS 1.141e-08

SelectedFake:Tau_E_Tau_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_7_3_11

Entries 0 Mean 0 RMS 0

SelectedFake:Tau_MU_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_8_3_11 Entries 2 Mean 0.7507 RMS 0.04884

SelectedFake:Tau_E_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_9_3_11 Entries 1 Mean 1.477 RMS 1.141e-08

SelectedFake:Tau_E_Tau_E