(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 2 4 6 8 10 12 14 16

HepgL_0_1_11 Entries 510 Mean 1.012 RMS 0.7586

Selected:MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

5

10

15

20

25

30

HepgL_1_1_11 Entries 983 Mean 0.9942 RMS 0.7406

Selected:E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

2

4

6

8

10

12

HepgL_2_1_11

Entries 412 Mean 1.118 RMS 0.78

Selected:E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

1

2

3

4

5

6

HepgL_3_1_11 Entries 99 Mean 0.9382 RMS 0.7558 Selected:Tau_MU_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.5 1 1.5 2 2.5 3 3.5 4

HepgL_4_1_11 Entries 65 Mean 0.9362 RMS 0.6517 Selected:Tau_E_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

1

2

3

4

5

HepgL_5_1_11 Entries 90 Mean 1.047 RMS 0.7587 Selected:Tau_MU_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0 0.5 1 1.5 2 2.5 3 3.5 4

HepgL_6_1_11 Entries 76 Mean 1.099 RMS 0.7881 Selected:Tau_E_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_9_1_11

Entries 0 Mean 0 RMS 0

Selected:Tau_E_Tau_E

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_7_1_11 Entries 2 Mean 0.7604 RMS 0.2015

Selected:Tau_MU_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 0

0.2

0.4

0.6

0.8

1

HepgL_8_1_11 Entries 4 Mean 1.098 RMS 0.7494 Selected:Tau_E_Tau_MU

(ll) ΦΔ 0 0.5 1 1.5 2 2.5 3 -1

-0.5

0

0.5

1

HepgL_9_1_11

Entries 0 Mean 0 RMS 0

Selected:Tau_E_Tau_E