(met, dilepton) ΦΔ Uncorrected

-3 -2 -1 0 1 2 3 4 5 6 0 20 40 60 80 100 120 140 160 180 200 220 MetDildPhi_0 Entries 3583 Mean -0.0108 RMS 2.418

(met, dilepton) ΦΔ MuCorrected

-3 -2 -1 0 1 2 3 4 5 6 0 50 100 150 200 250 300 350 400 450

MetDildPhi_1 Entries 3583 Mean -0.03698 RMS 2.777

(met, dil) ΦΔ JetMuonCorrected

-3 -2 -1 0 1 2 3 4 5 6 0 50 100 150 200 250 300 350 400 450

MetDildPhi_2 Entries 3583 Mean -0.03153 RMS 2.737

(met, dilepton) ΦΔ JetMuPhxCor

-3 -2 -1 0 1 2 3 4 5 6 0 50 100 150 200 250 300 350 400 450

MetDildPhi_3 Entries 3583 Mean -0.03487 RMS 2.737

(met, dilepton) ΦΔ JetMuPhxCenCor

-3 -2 -1 0 1 2 3 4 5 6 0 50 100 150 200 250 300 350 400 450

MetDildPhi_4 Entries 3583 Mean -0.0348 RMS 2.737