VBFNVtx

0 1 2 3 4 5 6 7 8 9 10

0.000

0.005

0.010

0.015

0.020

0.025

0.030^{Default Scale}

Scale σ+1 Scale σ-1

2 =135GeV/c H WH,M^{-1} L = 8.2 fb∫