VBFHt

0 100 200 300 400 500 600

0.0000

0.0002

0.0004

0.0006

0.0008

0.0010_{Default Scale}

Scale σ+1 Scale σ-1

2 =160GeV/c H WH,M^{-1} L = 8.2 fb∫